\begin{table}%t3
\caption{Luminosities and stellar mass to light ratio computed in\protect different rest frame filters.}\label{cD}
%\centerline
 {\small \begin{tabular}{ccccc}
\hline \hline
Filter  &  $L$ (no Av) & $L$ (Av) & $M_{*}/L$ (no Av) & $M_{*}/L$ (Av)\\
\hline
$B$ & $1.1\times 10^{11}$ &$1.6\times 10^{11}$ & 11.2 & 8.1 \\
555 & $1.5\times 10^{11}$ & $2.2\times 10^{11}$ & 7.8 & 5.9 \\
606 & $1.7\times 10^{11}$ & $2.5\times 10^{11}$ & 6.8 & 5.2 \\
775 & $1.5\times 10^{11}$ & $2.2\times 10^{11}$ & 7.7 & 6.0 \\
$H$  & $7.2\times 10^{11}$ & $9.5\times 10^{11}$ & 1.6 &  1.4\\
\hline
\end{tabular}}
\smallskip
The $B$ filter corresponds to the standard Bessell $B$~filter, and values are given in this filter in order to allow easier comparisons with other galaxies studied by different authors. All values are given in solar units. We report values corresponding to two different fits, with and without\protect reddening respectively.
\end{table}