\begin{table}%t1
%\centering
\par
     \caption{Summary of basic information and
     DIB measurements for the program stars. {\em pl} is the RAVE fiber
     plate number (1 or 2), and {\em fiber} is the fiber number of the given
     plate (from 1 to 150). $\lambda_\odot$ is the measured heliocentric
     wavelength of the DIB and $ e w$ its equivalent width, both in \AA.
     Photometric magnitudes are in the Johnson system.}
     \label{tab1}
     \includegraphics[width=38cm,clip]{0232tab1.eps}
  \end{table}