\begin{table}%t2
%\centering
\par
\caption{Broad-line measurements.}
\label{tab2}
\begin{tabular}{lccccccccccc}
\hline\hline
Object & Flux & {\it FWHM} & Fit & $R_{\rm Fe}$ & Flux & {\it FWHM} & Flux & Flux  & log~$\lambda L_{\lambda}$ & 
$a_{\rm \nu}$ & log~$M_{\rm BH}$ \\
 & H$\beta$ & H$\beta$ & H$\beta$ & & H$\alpha$ & H$\alpha$ & HeII4686 & HeI5876 & 5100~\AA & &  \\
\hline
2MASXJ005050+35 & 180 & 3690 & G & 0.49 & 460 & 3060 & 39 & 37 & 44.0 & 2.7 & 7.5 \\
MCG+08.17.060   & ? & ? & & ? & 92 & 2740 & ? & ? & 43.6 & ? & ? \\
RXS J11401+4115 & 21 & 3130 & G? & 1.05 & 72 & 2290 & & &  43.7 & 1.4 & 7.2 \\
PG 1211+143 & 415 & 1810 & L & 0.30 & 1400 & 1280 & & 38 & 44.6 & $-$0.5 & 7.3 \\
RXS J12308+0115 & 106 & 2120 & L? & 1.25 & & & 2 & ? & 44.7 & $-$0.6 & 7.5 \\
RXS J16312+0955 & 23 & 4380 & G & 0.96 & 113 & 2290 & 3 & 5 & 44.1 & $-$1.4 & 7.7 \\
RXS J17233+3630 & 55 & 4920 & G & $\leq$0.5 & 370 & 2600 & 15 & 21 & 43.2 & $-$5.8 & 7.2 \\
IRAS 18423+2201 & 14 & 3810 & G & $\leq$0.5 & 90 & ? & 4 & 10? & 43.3 & $-$3.4& 7.1 \\
NPM1G+27.0587 & 113 & 3870 & G & 0.78 & 460 & 2740 & 25 & 75 & 44.1 & 0.4 & 7.6 \\
RXS J20440+2833 & 268 & 2500 & L? & 0.46 & 837 & 1690 & & 44 & 44.2 & $-$1.0 & 7.3 \\
NPM1G-05.0589 & & & & -- & $<$30 & 11450? & 2 & & -- & -- & -- \\
RXS J21240-0021 & 6 & 4320 & G & $<$0.1 & $<$24 & 6850? & 5 & 3? & 42.8 & $-$0.2 & 6.8 \\
NPM1G+24.0470 & & & & -- & 27 & 6220 & 0 & 3 & 42.9 & $-$0.7 & -- \\
RXS J21592+0952 & 20 & 6950 & G & 0.36 & 133 & 7400 & 2 & ? &  43.9 & $-$2.0 & 8.0 \\
RXS J22027-1304 & 15 & 4750 & G & $<$0.1 & 50 & 2560 & & 7 &  43.1 & $-$3.2 & 7.1 \\
RXS J22160+1107 & 3 & 3310 & G & - & 13 & 3650? & 4 & ? & 42.6 & $-$0.4 & 6.4 \\
RXS J22287+3335 & 36 & 3630 & G & 0.61 & 130 & 2610 & 12 & 25 &  43.9 & $-$0.7 & 7.4 \\
NPM1G-04.0637 & 14 & 7250 & G & $<$0.1 & 84 & 4750 & 9? & 0 & 42.2 & $-$7.6 & 6.9 \\
\hline
\end{tabular}
\end{table}