\begin{table}%t4
\caption{Oxygen LTE abundance for each line with the error estimates.}
\label{finaboxy}
%\begin{center}
\par
\begin{tabular}{rcccccccc}
\hline\hline\noalign{\smallskip}
 Line   & $A$(O)$_{\rm 3D}$ & $A$(O)$_{\rm HM}$      & Statistical & \loggf & Broadening & Blend  & Total & Spectrum \\
\pun{nm}&      &      & error     & error       & error  & error      & error  &  \\
\noalign{\smallskip}\hline\noalign{\smallskip}
 615.8  & 8.64 & 8.78 & 0.01      & 0.16   &  0.01      &  0.14  &  0.21 & F   \\
 615.8  & 8.63 & 8.77 & 0.02      & 0.16   &  0.01      &  0.14  &  0.21 & I   \\
 630.0  & 8.68 & 8.69 & 0.02      & 0.03   &  0.00      &  0.15  &  0.15 & F/I \\
 636.3  & 8.78 & 8.79 & 0.05      & 0.03   &  0.00      &  0.12  &  0.12 & F/I \\
 777.1  & 9.03 & 9.03 & 0.00      & 0.07   &  0.06      &  0.08  &  0.12 & F    \\
 777.1  & 8.93 & 8.91 & 0.01      & 0.07   &  0.07      &  0.05  &  0.11 & I    \\
 777.4  & 8.99 & 8.99 & 0.01      & 0.07   &  0.05      &  0.06  &  0.11 & F   \\
 777.4  & 8.88 & 8.86 & 0.02      & 0.07   &  0.06      &  0.06  &  0.11 & I   \\
 777.5  & 8.96 & 8.97 & 0.00      & 0.07   &  0.04      &  0.06  &  0.10 & F   \\
 777.5  & 8.88 & 8.88 & 0.01      & 0.07   &  0.03      &  0.06  &  0.10 & I   \\
 844.6  & 8.83 & 8.87 & 0.00      & 0.23   &  0.03      &  0.24  &  0.33 & F   \\
 844.6  & 8.80 & 8.83 & 0.00      & 0.23   &  0.03      &  0.24  &  0.33 & I   \\
 926.6  & 8.74 & 8.80 & 0.01      & 0.07   &  0.02      &  0.09  &  0.12 & I   \\
1130.2  & 8.75 & 8.82 & 0.01      & 0.07   &  0.01      &  0.15  &  0.17 & I    \\
1316.4  & 8.76 & 8.82 & 0.01      & 0.16   &  0.01      &  0.15  &  0.22 & I   \\
\noalign{\smallskip}\hline\noalign{\smallskip}
\end{tabular}
%\end{center}
\par
The second and third columns are the LTE abundance using the \cobold\ 3D and HM 
model, respectively. The last column indicates whether a flux ($F$) or
intensity ($I$) measurement was used.
\end{table}