\begin{table}%t2
%\centering
\par
\caption{The parameter values of the precomputed \kosma{}
 clumps are equidistant on logarithmic scale in steps of 
 half an order of magnitude.
}\label{t_kosma_par_cube}
%\centering
\par
\begin{tabular}{lc}
\hline \hline
%\multicolumn{2}{c}{\bf{\kosma} parameter cube} \\
Quantity & Parameter range \\
\hline\noalign{\smallskip}
Density $n\ind{s} / \pcc$ & $10^2$, \ldots, $10^6$ \\
Mass $M\ind{cl} / \msun$ & $10^{-3}$, \ldots, $10^3$ \\
FUV flux $\chi / {\fdraine}$ & $10^0$, \ldots, $10^6$ \\
\hline
\end{tabular}
\end{table}