\begin{table}%t1
%\centering
\par
\caption{Properties of the \kosma~clumps with given masses and densities at an
incident FUV-flux of $10^2$~\fdraine.
Orders of magnitude are given in parentheses.
\label{t_kosma_info}}
%\centering
\par
\begin{tabular}{ccccccc}
\hline \hline
\multicolumn{2}{c}{Densities} & Mass & \multicolumn{2}{c}{Column densities} & 
\multicolumn{2}{c}{Temperatures} \\
Surface & Center & & \multicolumn{4}{c}{Clump average} \\
$\log(n\ind{\rm s}/\pcc)$ & $\log(n\ind{\rm c}/\pcc)$ & $\log(M\ind{\rm cl}/\msun)$ & 
$\left< N_{\htwo} \right>$ & $\left< N_{\co} \right>$ & 
$\left< T_{\htwo} \right>$ & $\left< T_{\co} \right>$ \\
\hline
3.5 & 4.55 & 3.0 & 1.41(22) & 1.71(18) & 21.7 & 12.3 \\
4.0 & 5.05 & 1.5 & 9.74(21) & 1.50(18) & 23.8 & 11.0 \\
4.5 & 5.55 & 0.0 & 6.69(21) & 1.07(18) & 26.5 & 12.5 \\
5.0 & 6.05 & $-1.5$ & 4.57(21) & 7.21(17) & 29.6 & 15.5 \\
5.5 & 6.55 & $-3.0$ & 3.12(21) & 4.94(17) & 32.8 & 19.9 \\
\hline
\end{tabular}
\end{table}