\begin{table}%t3
%\centering
\par
\caption{Multi-wavelength detection statistics in the ELAIS-S1 
area.
\label{tab:multilambda_stats}}
\begin{tabular}{l c r}
\hline
\hline
Class & Area & Number \\
 & $[$deg$^2]$ & \\
\hline
SWIRE ($I$-band area)& 4.11 & 219~877 \\
SWIRE+{\it BVRIz} (one band) & 3.89 & 142~776\\
SWIRE+{\it BVR} (one band) & 1.5 & 52~620 \\
SWIRE+$I$ & 3.89 & 137~206\\
SWIRE+$z$ & 0.98 & 35~670 \\
SWIRE+GALEX & 4.11 & 30~355 \\
24~$\mu$m & 4.11 & 12~770\\
\hline
SWIRE ($z$-band area)& 0.98 & 63~770 \\
SWIRE+{\it BVRIz} (one band) & 0.98 & 45~873\\
SWIRE+{\it BVR} (one band) & 0.98 & 39~883 \\
SWIRE+$I$ & 0.98 & 41~337\\
SWIRE+$z$ & 0.98 & 35~670 \\
SWIRE+GALEX & 0.98 & 8884 \\
24~$\mu$m & 0.98 & 3733\\
\hline
4.5~$\mu$m-peak (total) & 4.11 & 938\\  
4.5~$\mu$m-peak (interlopers) & 4.11 & 353\\ 
5.8~$\mu$m-peak & 4.11 & 973 \\  
\hline
\end{tabular}
\end{table}