\begin{table}%t9
\caption{Consistency intervals obtained for different values of $\beta$ ($\lambda=0.025$ for all cases).}\label{table13}
%\centerline
 {\small \begin{tabular}{ccccc}
\hline \hline
 $\beta$  & $n$ & Consistency intervals & $n_1$ & $n_2$   \\ \hline
 $0.1$ &$12$& $(0.45,1.17)~~(1.86,2.30)$  &$12$ &$69$\\ 
 $0.05$ &$15$& $(0.45,1.14)~~ (1.90,2.30)$ &$12$ &$67$\\ 
 $0.025$ &$18$& $(0.45,1.14)~~ (1.92,2.30)$ &$11$ &$67$ \\
  \hline
\end{tabular}}
\medskip
Notes.  $n_1$ is the number of data reported by   \citet{Chand04} that are consistent with $n_2$ data from \citet{Murphy03b}.
\end{table}