\begin{table}%t1
%\centering
\par
\caption{Log of the FEROS observations of \AD, \VZ, and \WZ.
HJD refers to mid-exposure.
The exposure time $t_{\rm exp}$ is given in seconds. The signal-to-noise ratio
per resolution element ($S/N$) of individual exposures was measured around 
6070~\AA. Observers: H = Heidelberg/Copenhagen guaranteed time; JVC = J.V.~Clausen;
JS = J.~Southworth.}\label{tab:feros}
\small 
\begin{tabular}{ccrrr}
\hline \hline
HJD$-$2~400~000               & Observer & Phase    &$t_{\rm exp}$ & $S/N$  \\
\hline
\AD               &    &             &      &        \\ 
51~207.8746        &JVC &  0.6844     & 2280 &  125   \\    
51~208.8792        &JVC &  0.1700     & 2400 &  200   \\   
\VZ               &    &             &      &        \\ 
51~207.6144        &JVC &  0.2192     & 1800 &  165   \\    
51~207.7489        &JVC &  0.2655     & 1800 &  160   \\   
51~210.7054        &JVC &  0.2835     & 2400 &  200   \\   
51~211.7137        &JVC &  0.6307     & 2400 &  240   \\   
51~563.8019        &JVC &  0.8606     & 2400 &  160   \\   
\WZ               &    &             &      &        \\    
51~390.6069        &H   &  0.3318     & 2700 &  210   \\   
52~776.7735        &JS  &  0.6727     &  300 &   50    \\  
52~776.8016        &JS  &  0.6794     &  300 &   45    \\  
52~776.8338        &JS  &  0.6871     &  300 &   55    \\  
52~776.8736        &JS  &  0.6966     &  300 &   50     \\ 
52~776.9054        &JS  &  0.7042     &  300 &   45     \\ 
52~777.6218        &JS  &  0.8754     &  300 &   55     \\ 
52~777.7127        &JS  &  0.8972     &  300 &   45     \\ 
52~777.7649        &JS  &  0.9096     &  300 &   75     \\ 
52~777.8076        &JS  &  0.9198     &  300 &   70     \\ 
52~777.8569        &JS  &  0.9316     &  300 &   55     \\ 
52~778.7325        &JS  &  0.1409     &  300 &   30     \\ 
52~778.7710        &JS  &  0.1501     &  420 &   50     \\ 
52~778.8148        &JS  &  0.1606     &  300 &   35     \\ 
\hline
\end{tabular}
\end{table}