\begin{table}%t6
\caption{Integrated intensities, $\int T_{\rm{MB}}\Delta V$ [K~km~s$^{-1}$], for H$_2$O lines in the wide parameter grid for an  abundance combination of $X_0=10^{-4}$ and $X_{\rm d}=10^{-7}$.}\label{table:h2ogrid_test}
%\centerline
 {\small  
\begin{tabular}{c c c c c c c}
\hline \hline\noalign{\smallskip}\noalign{\smallskip}
Transition   &  \multicolumn{6}{c}{Integrated intensity ( $\int T_{\rm{MB}}\Delta V$ [K km
    s$^{-1}$])} \\ %\hline\noalign{\smallskip}
& \multicolumn{3}{c}{Lum.  (w. $n_0 = 10^6$~cm$^{-3}$)} & \multicolumn{3}{c}{Dens. (w. $L= 7$ $L_{\odot}$)} \\ 
 & 2 & 7 & 25 & 0.4 & 1 & 5\\ \hline
& \multicolumn{6}{c}{$p=1.5$} \\  
\multicolumn{7}{c}{Ortho-H$_2$O transitions}\\ %\hline
1$_{10}$--1$_{01}$ & 0.37 & 0.95 & 0.70 &0.43 & 0.95 & 2.1\\ 
2$_{12}$--1$_{01}$ & 0.35 & 0.36 &--1.2 & 0.30& 0.36  & --4.4\\
2$_{21}$--2$_{12}$ & 0.29 & 0.87 & 1.5 & 0.60& 0.87  & 0.74\\
3$_{12}$--3$_{03}$ & 0.21 & 0.60 & 1.5 & 0.38& 0.60  & 0.89\\
3$_{12}$--2$_{21}$ & 0.21 & 0.67 & 1.6 & 0.40& 0.67  & 0.84\\
3$_{21}$--3$_{12}$ & 0.37 & 1.1  & 2.7 & 0.59& 1.1   & 1.7\\ \hline
\multicolumn{7}{c}{Para-H$_2$O transitions}\\ %\hline
1$_{11}$--0$_{00}$ & 0.13 & 1.0& 0.31& 0.43&1.0 & 1.6\\
2$_{02}$--1$_{11}$ & 0.58 & 1.5& 3.0  & 0.72&  1.5&1.1 \\
2$_{11}$--2$_{02}$ & 0.34 & 1.0& 2.0 & 0.41& 1.0& 2.7\\
2$_{20}$--2$_{11}$ & 0.31 & 1.0& 2.3 & 0.47& 1.0& 1.4\\
3$_{31}$--4$_{04}$ & 4.3(--2) &0.15 & 0.58 & 0.18 & 0.15 & 1.3(--3)\\
4$_{22}$--3$_{31}$ & 4.1(--2) & 0.13& 0.48&0.13 &0.13 & 9.6(--2)\\
4$_{22}$--4$_{13}$ & 9.5(--2) & 0.26& 0.74& 0.18& 0.26 &2.3(--3) \\
5$_{24}$--4$_{31}$ &  5.0(--2)& 0.15& 0.57& 0.16& 0.15& 8.7(--2)\\ \hline 
  & \multicolumn{6}{c}{$p=2.0$} \\ %\hline
\multicolumn{7}{c}{Ortho-H$_2$O transitions}\\ %\hline
1$_{10}$--1$_{01}$ & 0.12 & 0.24& 0.19& 0.10 &  0.24& 0.82\\ 
2$_{12}$--1$_{01}$ & 0.89 &-1.6 &--3.1 & 0.71 & --1.6 & --5.0\\
2$_{21}$--2$_{12}$ & 0.13 & 0.14& 0.15& 0.13 &  0.14& --1.4\\
3$_{12}$--3$_{03}$ & 0.12 & 0.47 & 1.3 & 0.35 &  0.47 & 0.51\\
3$_{12}$--2$_{21}$ & 0.13 & 0.48& 1.2 & 0.29 &  0.48& 0.49\\
3$_{21}$--3$_{12}$ & 0.20 & 0.87& 2.1 & 0.45 &  0.87& 1.2\\ \hline
\multicolumn{7}{c}{Para-H$_2$O transitions}\\ %\hline
1$_{11}$--0$_{00}$ & 0.30 & 9.4(--2)& 0.23& 0.52& 9.4(--2) & 9.0(--2)\\
2$_{02}$--1$_{11}$ & 0.65 & 1.4& 3.1& 0.90& 1.4& 1.8\\
2$_{11}$--2$_{02}$ & 0.46 & 0.94& 2.1     & 0.56& 0.94& 2.2\\
2$_{20}$--2$_{11}$ & 0.32 & 0.78& 2.1     & 0.54& 0.78& 1.3\\
3$_{31}$--4$_{04}$ & --3.7(--3) & --6.7(--3) & 0.13 & 7.1(--2)& --6.7(--3) & --1.2(--3) \\
4$_{22}$--3$_{31}$ & 1.0(--2) &5.9(--2) &0.31 & 9.3(--2) & 5.9(--2)& 2.3(--3)\\
4$_{22}$--4$_{13}$ & 4.7(--2) & 0.19 & 0.74 & 0.22& 0.19& 8.1(--2)\\
5$_{24}$--4$_{31}$ & 8.3(--3) & 6.5(--2)& 0.34 & 0.11 & 6.5(--2)& --6.9(--3)\\ \hline  
\end{tabular}}
\medskip
 Columns 2 to 4 show the luminosity variation  with a density of 10$^6$~cm$^{-3}$. Columns~5 to 7 show the variation of density with a luminosity of 7~$L_{\odot}$.
\end{table}