\begin{table}%tc.1
\caption{The difference between the integrated CO($J\rightarrow J-1$) intensities from the best-fit model and the observations, in percent; $(I_{\rm{mod}}-I_{\rm{obs}})/I_{\rm{obs}}$.}\label{intensities_diff}
\begin{tabular}{lcccccc}
\hline\hline\noalign{\smallskip}
 Source  & OSO & \multicolumn{4}{c}{{ {JCMT}}} \\ 
\cline{2-2} \cline{4-7}
& \multicolumn{1}{c}{$1\rightarrow0$} &&\multicolumn{1}{c}{$2\rightarrow1$} &
\multicolumn{1}{c}{$3\rightarrow2$} &\multicolumn{1}{c}{$4\rightarrow3$}& 
\multicolumn{1}{c}{$6\rightarrow5$} \\
\noalign{\smallskip} \hline \noalign{\smallskip}
\object{LP And} & 3.2 &   &5.4 &  15.8 &   4.2 &  --0.6 \\
\object{CW Leo}	 &  4.8 &  &--7.3  & --15.6  & --11.7 & $\cdots$ \\
\object{RW LMi} & --16.6 &  &37.4 &   --1.6 &   6.2 & $\cdots$ \\
\object{V384 Per} & --22.3 &   &--20.3 &  63.8  & --15.3 & $\cdots$ \\
\object{AFGL 3068} &  6.3 &    &--4.2  &   11.0 & --13.3 & 34.6 \\	
 & && & & & \\
\object{TX Cam} & --7.7 &   &56.9  &  40.2 & --18.9 & $\cdots$ \\
\object{GX Mon}&  1.6 &    &--3.4 &   --1.9 &  3.4 & $\cdots$ \\
\object{WX Psc} &  --3.2 &  &--14.8 &   23.8 &  6.8  & 273.7  \\	
\object{IK Tau}	&  --3.3 &  &--1.4 &  9.2 & 16.4 & $\cdots$ \\
\object{IRC--10529}	&  --3.5 &  &--44.8 &  11.9  & 38.9 & $\cdots$ \\
\hline
\end{tabular}
\end{table}