\begin{table}%tA.1
%\centering
\par
\caption{Values for the parameters in Eq.~(\ref{MdotEq}). $s_J$ is calibrated such that Eq.~(\ref{MdotEq}) gives the mass-loss rate in $M_\odot$~yr$^{-1}$. Values are valid in the ranges 10$^{-7} \leq \dot{M} \leq 10 ^{-5}~M_\odot$~yr$^{-1}$, $5 \leq v_{{\rm e}} \leq 20$~km~s$^{-1}$, $10^{-4} \leq f_{{\rm CO}} \leq 10 ^{-3}$.}\label{MdotPara}
\small \begin{tabular}{ccccc}
\hline\hline
\noalign{\smallskip}
 Transition  &$s_J$ & $a_J\ (I)$ & $b_J\ (v_{\rm e})$  & $c_J\ (f_{\rm CO})$ \\ 
\noalign{\smallskip} \hline \noalign{\smallskip}
$J = 1 \rightarrow 0$  & $4.9(\pm2.4) \times 10^{-12}$ & $0.68(\pm0.03)$ & $0.59(\pm0.13)$ & $0.80(\pm0.08)$ \\
$J = 2 \rightarrow 1$  & $1.3(\pm0.7) \times 10^{-11}$ & $0.82(\pm0.03)$ & $0.46(\pm0.13)$ & $0.59(\pm0.07)$ \\
$J = 3 \rightarrow 2$  & $3.8(\pm3.4) \times 10^{-11}$ & $0.91(\pm0.04)$ & $0.39(\pm0.13)$ & $0.45(\pm0.07)$ \\
$J = 4 \rightarrow 3$  & $8.4(\pm4.1) \times 10^{-11}$ & $0.95(\pm0.04)$ & $0.36(\pm0.13)$ & $0.37(\pm0.07)$ \\
\hline
\end{tabular}
\end{table}