\begin{table}%t7
%\centering
\par
\caption{The resulting change in mass-loss rate ($\dot{M}$) and dust-to-gas ratio ($\Psi$) when varying the input parameters in the dynamical model of RW~LMi.}\label{dynerr}
\begin{tabular}{llll}
\hline\hline \noalign{\smallskip}
 Parameter & Change & $\dot{M}$ & $\Psi$ \\
\noalign{\smallskip} \hline \noalign{\smallskip}
$L$ & +50\% &  +50\% &  --35\% \\
 & --50\% &  --50\% & +100\% \\
$M_{*}$ &  +50\% &--25\% & +30\% \\
 & --50\% &  +30\% & --30\% \\	
$\sigma_{\rm{d}}$ &  +50\%  & +50\% & --35\% \\
        & --50\% &  --50\% & +125\% \\
$m_{\rm{d}}$ &  +50\% & --35\% & +60\% \\
        & --50\% &  +105\% & --55\% \\
$\tau_{10}$ & +50\% &  +35\% & +10\% \\
 & --50\% &--40\% & --10\% \\
{\bf $Q_{\lambda}$} & +50\% &  +50\% & --35\% \\
        &--50\% &--50\% & +100\% \\
\hline
\end{tabular}
\end{table}