\begin{table}%t3
\caption{\label{tab:stream}Comparison of two models with and without stream inflow, all other parameters being
identical. The viscosity is $\nu = 10^{-4}$ and at the inner boundary ``viscous outflow''
conditions are applied.
The  model that has no stream  corresponds to the second model in Table~\ref{tab:res-bc}.
}
\small%\centering
\par
\begin{tabular}{llll}
\hline\hline
Boundary condition   &  $e_{\rm d}$   &  $r_{\rm d}$   &  $\dot\varpi_{\rm d} [1/P_{\rm orb}]$    \\
\hline
No stream inflow     &   0.56   &  0.651   &  --0.060  \\
With stream inflow   &   0.55   &  0.610   &  --0.0072 \\
\hline
\end{tabular} 
\end{table}