\begin{table}%t1
\caption{Examples of atomic parameters and measured solar equivalent widths for
\ion{Fe}{ii} and \ion{Fe}{i}~lines. This table is electronically available at the CDS and also at the author webpage.}\label{tab1}
%\centering
\small
\begin{tabular}{lcccc}
\hline
\hline
&&&& \\[-8pt]
$\lambda$ (\AA) & $\chi_{l}$ & $\log{gf}$ & Ele. & $EW_{\odot}$ (m\AA)\\
\hline
4508.28  &   2.86  &   --2.403 & FeII  &   87.3 \\
4520.22  &   2.81  &   --2.563 & FeII  &   81.9 \\
4523.40  &   3.65  &   --1.871 & FeI   &   44.2 \\
4531.62  &   3.21  &   --1.801 & FeI   &   66.4 \\
4534.17  &   2.86  &   --3.203 & FeII  &   53.7 \\
4537.67  &   3.27  &   --2.870 & FeI   &   17.4 \\
4541.52  &   2.86  &   --2.762 & FeII  &   71.5 \\
4551.65  &   3.94  &   --1.928 & FeI   &   29.1 \\
4554.46  &   2.87  &   --2.752 & FeI   &   37.4 \\
4556.93  &   3.25  &   --2.644 & FeI   &   26.3 \\
4576.34  &   2.84  &   --2.947 & FeII  &   64.9 \\
  ...    &    ...  &     ...  & ...   &   ...  \\
\hline
\end{tabular}
\end{table}