\begin{table}%t2
\caption{Coefficients of the Fourier fit to the $B_{\rm E}$ light curve with a period $P = 5$.5675 days between the epochs $E_{\rm b}$ and $E_{\rm e}$. $\Delta X$ represents the error in $X$. The error in $R_0$ is similar to the mean error in $B_{\rm E}$, e.g. 0.029~mag, while the mean error in $R_1$ is 0.003. All other quantities are defined in the text. The first row refers to the red line in the upper panel of Fig.~\ref{complete.fig}. The other rows refer to a study completed for blocks of 100 measurements, for which the long-term variation was corrected.}
\label{Fourier.tab}
\small
%\centering
\par
\begin{tabular}{ccccccccc}
\hline
\hline
$E_{\rm b} - 2$~450~000 & $E_{\rm e} - 2$~450~000 & $R_0$ & $R_1$ & $\phi_1$ & $R_{21}$ & $\phi_{21}$ & $\Delta R_{21}$ & $\Delta \phi_{21}$ \\
292.8648  & 2698.5268 & 16.125 & 0.082 &  0.274 & 0.101 & 4.573 & 0.022 & 0.220 \\
\hline
292.8648  & 807.6200  & 16.118 & 0.146 &  0.284 & 0.245 & 5.636 & 0.022 & 0.092 \\
488.5442  & 1037.7914 & 16.118 & 0.130 &  0.106 & 0.220 & 6.083 & 0.027 & 0.134 \\
810.6014  & 1171.5550 & 16.121 & 0.118 & --0.086 & 0.132 & 0.450 & 0.027 & 0.219 \\
1039.7866 & 1340.8647 & 16.119 & 0.095 & --0.160 & 0.026 & 1.773 & 0.030 & 1.161 \\
1173.5735 & 1430.7374 & 16.118 & 0.093 &  0.029 & 0.083 & 3.687 & 0.044 & 0.524 \\
1341.8360 & 1551.5909 & 16.122 & 0.090 &  0.398 & 0.128 & 3.542 & 0.054 & 0.414 \\
1433.7395 & 1742.8458 & 16.120 & 0.098 &  0.733 & 0.096 & 2.364 & 0.037 & 0.401 \\
1553.5609 & 1845.5713 & 16.122 & 0.099 &  0.841 & 0.134 & 2.064 & 0.036 & 0.274  \\
1744.8375 & 1924.6267 & 16.137 & 0.074 &  0.862 & 0.186 & 2.067 & 0.055 & 0.309 \\
1848.5785 & 2020.9232 & 16.132 & 0.048 &  0.763 & 0.248 & 2.516 & 0.077 & 0.335 \\
1926.6210 & 2093.7241 & 16.120 & 0.043 &  0.525 & 0.227 & 3.272 & 0.071 & 0.334 \\
2025.8887 & 2167.8788 & 16.122 & 0.047 &  0.245 & 0.217 & 4.169 & 0.066 & 0.344 \\
2093.7841 & 2223.7505 & 16.113 & 0.043 &  0.157 & 0.225 & 4.459 & 0.062 & 0.319 \\
2168.5507 & 2294.5823 & 16.113 & 0.044 &  0.557 & 0.195 & 3.862 & 0.058 & 0.299 \\
2224.7489 & 2446.7581 & 16.121 & 0.050 &  0.506 & 0.161 & 4.723 & 0.067 & 0.447 \\
2297.5690 & 2546.5336 & 16.125 & 0.057 & --0.012 & 0.158 & 0.336 & 0.056 & 0.368 \\
2448.7357 & 2622.5676 & 16.120 & 0.050 & --0.250 & 0.083 & 1.267 & 0.061 & 0.748 \\
\hline
\end{tabular}
\end{table}