\begin{table}
\caption{\label{tab7} Observed continuum, H$\alpha$, H$\beta$,
H$\gamma$, and HeII$\lambda~4686$ fluxes, reduced to the 6 m telescope
aperture $2''\times 6''$. The fluxes are corrected for  position
angle (to $\rm PA=90$~degree), seeing, and aperture effects. Columns: 2 --  the continuum flux at 5117~\AA~
(in units of $10^{-14}$~ erg~s$^{-1}$~cm$^{-2}$~\AA$^{-1}$),
and  the estimated  continuum flux error; 3 --
the H$\alpha$ total flux and   the H$\alpha$ flux error; 4 --  the
H$\beta$ total flux and  the H$\beta$ flux error; 5 -- the
H$\gamma$ total flux and  the H$\gamma$ flux error; 6 -- the
HeII$\lambda$4686 total flux and  the HeII$\lambda$4686 flux error. All line fluxes are in units of
10$^{-12}$~erg~s$^{-1}$~cm$^{-2}$.}
\begin{tabular}{lrllll}
 \hline\hline
 JD     &
$F{\rm (cont)} \pm\varepsilon_{\rm cont}$&
$F(\rm H\alpha)\pm\varepsilon_{\rm H\alpha}$&
$F(\rm H\beta)\pm\varepsilon_{\rm H\beta}$&
$F(\rm H\gamma)\pm\varepsilon_{\rm H\gamma}$&
$F(\rm HeII)\pm\varepsilon_{\rm HeII}$ \\
\hline
50~094.5&   8.8    $\pm$ 0.34 &--        & 8.03 $\pm$ 0.31&  4.807 $\pm$ 0.361&  3.136 $\pm$ 0.031\\
50~097.6&   9.26   $\pm$ 0.36 &33.41 $\pm$ 0.63& 8.19 $\pm$ 0.32&  3.893 $\pm$ 0.292&  2.707 $\pm$ 0.027\\
50~098.6&   9.26   $\pm$ 0.36:&35.16 $\pm$ 0.63& --      &  --         &  --          \\
50~128  &   11.25  $\pm$ 0.44 &34.34 $\pm$ 0.65& 9.28 $\pm$ 0.36&  4.524 $\pm$ 0.339&  3.495 $\pm$ 0.035\\
50~162.4&   11.66  $\pm$ 0.45 &--        & 8.9 $\pm$0.35&  3.638 $\pm$ 0.273&  2.22 $\pm$ 0.022\\
50~163.3&   11.66  $\pm$ 0.45:&33.79 $\pm$ 0.64& --      &  --         &  --          \\
50~164.4&   10.78  $\pm$ 0.42 &--        & 8.5 $\pm$0.33&  4.044 $\pm$ 0.303&  3.485 $\pm$ 0.035\\
50~165.4&   10.78  $\pm$ 0.42:&33.24 $\pm$ 0.63& --          &  --         &  --          \\
50~166.3&   10.78  $\pm$ 0.42:&32.04 $\pm$ 0.61& --         &  --         &  --          \\
50~200.3&   9.6    $\pm$ 0.37 &--        & 9.34 $\pm$ 0.36&  --         &  --          \\
50~201.3&   8.85   $\pm$ 0.35 &30.97 $\pm$ 0.59& 8.73 $\pm$ 0.34&  --         &  --          \\
50~249.3&   12.64  $\pm$ 0.49 &35.45 $\pm$ 0.67& 8.24 $\pm$ 0.32&  --         &  --          \\
50~275.3&   11.99  $\pm$ 0.47 &35.72 $\pm$ 0.68& 9.83 $\pm$ 0.38&  4.649 $\pm$ 0.349&  3.313 $\pm$ 0.033\\
50~276.3&   11.99  $\pm$ 0.47:&35.88 $\pm$ 0.68& --      &  --         &  --          \\
50~277.3&   11.29  $\pm$ 0.44 &36.6 $\pm$ 0.70& 9.26 $\pm$ 0.36&  --         &  --          \\
50~280.3&   12.19  $\pm$ 0.48 &35.95 $\pm$ 0.68& 10  $\pm$0.39&  --         &  --          \\
50~281.3&   12.19  $\pm$ 0.48:&35.53 $\pm$ 0.68& --      &  --         &  --          \\
50~392.6&   10.04  $\pm$ 0.39 &--        & 9.97 $\pm$ 0.39&  --         &  --          \\
50~402.6&   10.65  $\pm$ 0.42 &39.95 $\pm$ 0.76& 10.8 $\pm$ 0.42&  5.003 $\pm$ 0.375&  3.792 $\pm$ 0.038\\
50~510.4&   7.84   $\pm$ 0.41 &32.4 $\pm$ 0.81& 9.08 $\pm$ 0.15&  --         &  --          \\
50~511.4&   8.86   $\pm$ 0.46 &--        & 9.57 $\pm$ 0.15&  --         &  --          \\
50~543.6&   6.82   $\pm$ 0.35 &32.15 $\pm$ 0.80& 7.44 $\pm$ 0.12&  3.336 $\pm$ 0.200&  2.088 $\pm$ 0.021\\
50~544.4&   6.47   $\pm$ 0.34 &32.54 $\pm$ 0.81& 7.35 $\pm$ 0.12&  --         &  --          \\
50~547.3&   6.92   $\pm$ 0.36 &--        & 7   $\pm$ 0.11&  --         &  --          \\
50~552.3&   7.38   $\pm$ 0.38 &--        & 8.5 $\pm$ 0.14&  --         &  --          \\
50~809.7&   7.56   $\pm$ 0.39 &--        & 9.07 $\pm$ 0.15&  --         &  --          \\ 
50~810.7&   7.22   $\pm$ 0.38 &--        & 9.04 $\pm$ 0.14&  --         &  --          \\
50~833.6&   5.91   $\pm$ 0.13 &31.65 $\pm$ 0.98& 7.31 $\pm$ 0.14&  3.256 $\pm$ 0.189&  1.912 $\pm$ 0.019\\
50~834.6&   6.09   $\pm$ 0.13 &31.03 $\pm$ 0.96& 7.54 $\pm$ 0.14&  3.466 $\pm$ 0.201&  2.12 $\pm$ 0.021\\
50~836.7&   6.4    $\pm$ 0.14 &--        & 7.33 $\pm$ 0.14&  3.837 $\pm$ 0.223&  2.745 $\pm$ 0.027\\
50~836.7&   6.42   $\pm$ 0.14 &--        & 7.82 $\pm$ 0.15&  3.619 $\pm$ 0.210&  2.524 $\pm$ 0.025\\
50~842.4&   6.59   $\pm$ 0.14 &32.87 $\pm$ 1.02& 8.02 $\pm$ 0.15&  --         &  --          \\
50~867.4&   6.22   $\pm$ 0.14 &33.34 $\pm$ 1.03& 7.34 $\pm$ 0.14&  3.363 $\pm$ 0.195&  2.445 $\pm$ 0.024\\
50~934.5&   6.39   $\pm$ 0.14 &33.14 $\pm$ 1.03& 7.06 $\pm$ 0.13&  --         &  --          \\
50~938.3&   6.55   $\pm$ 0.14 &33.6 $\pm$ 1.04& 6.77 $\pm$ 0.13&  2.643 $\pm$ 0.153&  1.902 $\pm$ 0.019\\
50~940.5&   6.27   $\pm$ 0.14 &30.78 $\pm$ 0.95& 6.82 $\pm$ 0.13&  2.878 $\pm$ 0.167&  1.457 $\pm$ 0.015\\
50~941.5&   5.64   $\pm$ 0.12 &--        & 6.41 $\pm$ 0.12&  2.608 $\pm$ 0.151&  1.135 $\pm$ 0.011\\
50~942.5&   5.7    $\pm$ 0.13 &29.87 $\pm$ 0.93& 6.42 $\pm$ 0.12&  2.432 $\pm$ 0.141&  1.516 $\pm$ 0.015\\
50~942.5&   6.09   $\pm$ 0.13 &--        & 6.25 $\pm$ 0.12&  2.653 $\pm$ 0.154&  1.157 $\pm$ 0.012\\ 
50~985.3&   8.52   $\pm$ 0.19 &34.03 $\pm$ 1.05& 8.29 $\pm$ 0.16&  3.118 $\pm$ 0.181&  2.738 $\pm$ 0.027\\
50~991.3&   7.43   $\pm$ 0.16 &--        & 8.24 $\pm$ 0.16&  3.692 $\pm$ 0.214&  2.946 $\pm$ 0.029\\
51~008.7&   5.84   $\pm$ 0.13 &31.09 $\pm$ 0.96& 7.44 $\pm$ 0.14&  3.355 $\pm$ 0.195&  1.743 $\pm$ 0.017\\
51~010.7&   5.98   $\pm$ 0.13 &28.62 $\pm$ 0.89& 7.59 $\pm$ 0.14&  3.677 $\pm$ 0.213&  2.173 $\pm$ 0.022\\
51~011.6&   5.81   $\pm$ 0.13 &28.82 $\pm$ 0.89& 7.47 $\pm$ 0.14&  3.258 $\pm$ 0.189&  1.974 $\pm$ 0.020\\
51~015.7&   6.26   $\pm$ 0.14 &31.15 $\pm$ 0.97& 7.84 $\pm$ 0.15&  3.637 $\pm$ 0.211&  1.829 $\pm$ 0.018\\
51~025.3&   6.21   $\pm$ 0.14 &30.15 $\pm$ 0.93& 7.45 $\pm$ 0.14&  --         &  --          \\
51~130.6&   5.69   $\pm$ 0.13 &32.59 $\pm$ 1.01& 7.05 $\pm$ 0.13&  --         &  --          \\
51~166.6&   4.26   $\pm$ 0.09 &33.07 $\pm$ 1.03& 6.96 $\pm$ 0.13&  --         &  --          \\
51~190.7&   5.56   $\pm$ 0.18:&29.56 $\pm$ 0.53& --      &  --         &  --          \\
51~191.9&   5.56   $\pm$ 0.18 &28.47 $\pm$ 0.51& 6.85 $\pm$ 0.16&  3.54 $\pm$ 0.202&  2.377 $\pm$ 0.150\\
51~193  &   5.81   $\pm$ 0.19 &28.47 $\pm$ 0.51& 6.6 $\pm$ 0.15&  3.465 $\pm$ 0.198&  2.62 $\pm$ 0.165\\
51~200.5&   6.07   $\pm$ 0.19 &--        & 7.36 $\pm$ 0.17&  --         &  --          \\
51~201.6&   6.42   $\pm$ 0.21 &33.51 $\pm$ 0.60& 7.91 $\pm$ 0.18&  --         &  --          \\
51~203.6&   6.57   $\pm$ 0.21 &34.83 $\pm$ 0.63& 8.05 $\pm$ 0.19&  --         &  --          \\
51~218.6&   6.43   $\pm$ 0.21 &35.24 $\pm$ 0.63& 7.86 $\pm$ 0.18&  3.74 $\pm$ 0.213&  2.888 $\pm$ 0.182\\
51~221.7&   6.38   $\pm$ 0.20 &36.73 $\pm$ 0.66& 8.09 $\pm$ 0.19&  3.452 $\pm$ 0.197&  3.043 $\pm$ 0.192\\ 
51~222.6&   6.06   $\pm$ 0.19 &--        & 7.92 $\pm$ 0.18&  --         &  --          \\ 
51~223.6&   5.69   $\pm$ 0.18 &--        & 7.34 $\pm$ 0.17&  --         &  --          \\
51~252.9&   5.03   $\pm$ 0.16 &29.45 $\pm$ 0.53& 6.16 $\pm$ 0.14&  2.886 $\pm$ 0.165&  1.883 $\pm$ 0.119\\
51~258.5&   5.79   $\pm$ 0.19 &32.55 $\pm$ 0.59& 6.95 $\pm$ 0.16&  --         &  --          \\
51~261.5&   5.81   $\pm$ 0.19 &31.19 $\pm$ 0.56& 6.93 $\pm$ 0.16&  --         &  --          \\
51~262.3&   5.77   $\pm$ 0.18:&31.47 $\pm$ 0.57& --      &  --         &  --          \\
51~262.5&   5.77   $\pm$ 0.18 &32.2 $\pm$ 0.58& 7.12 $\pm$ 0.16&  --         &  --          \\
51~277.6&   5.79   $\pm$ 0.19 &--        & 7.6 $\pm$ 0.17&  3.425 $\pm$ 0.195&  3.217 $\pm$ 0.203\\
51~279.5&   5.5    $\pm$ 0.18 &34.91 $\pm$ 0.63& 7.51 $\pm$ 0.17&  --         &  --          \\
51~283.5&   5.29   $\pm$ 0.17 &--        & 6.56 $\pm$ 0.15&  --         &  --          \\
51~344.3&   2.87   $\pm$ 0.09 &--        & 4.2 $\pm$0.10&  1.716 $\pm$ 0.098&  0.998 $\pm$ 0.063\\
51~346.4&   2.75   $\pm$ 0.09 &--        & 4.29 $\pm$ 0.10&  2.212 $\pm$ 0.126&  1.092 $\pm$ 0.069\\
51~514.6&   2.77   $\pm$ 0.09 &--        & 3.52 $\pm$ 0.08&  1.668 $\pm$ 0.095&  1.252 $\pm$ 0.079\\
51~515.6&   2.79   $\pm$ 0.09 &22.94 $\pm$ 0.41& 3.6 $\pm$0.08&  1.58 $\pm$ 0.090&  1.193 $\pm$ 0.075\\
51~517.6&   3.1    $\pm$ 0.10 &--        & 3.47 $\pm$ 0.08&  1.574 $\pm$ 0.090&  1.391 $\pm$ 0.088\\
51~552.6&   4.16   $\pm$ 0.10 &--        & 4.51 $\pm$ 0.09&  --         &  --          \\
51~553.6&   4.16   $\pm$ 0.10:&25.93 $\pm$ 0.93& --      &  --         &  --          \\ 
51~570.9&   3.86   $\pm$ 0.09:&25.13 $\pm$ 0.90& --      &  --         &  --          \\
51~571.9&   3.86   $\pm$ 0.09 &23.57 $\pm$ 0.85& 4.67 $\pm$ 0.10&  2.257 $\pm$ 0.065&  1.035 $\pm$ 0.049\\
51~585.5&   3.56   $\pm$ 0.08 &--        & 4.16 $\pm$ 0.09&  2.615 $\pm$ 0.076&  1.52 $\pm$ 0.071\\
51~588.5&   3.6    $\pm$ 0.08 &--        & 4.48 $\pm$ 0.09&  2.021 $\pm$ 0.059&  1.517 $\pm$ 0.071\\
51~589.5&   3.6    $\pm$ 0.08:&24.12 $\pm$ 0.87& --      &  --         &  --          \\
51~600.8&   2.78   $\pm$ 0.06 &22.51 $\pm$ 0.81& 4.01 $\pm$ 0.08&  --         &  --          \\
51~601.8&   2.77   $\pm$ 0.06 &22.28 $\pm$ 0.80& 4.15 $\pm$ 0.09&  --         &  --          \\
51~638.5&   2.53   $\pm$ 0.06 &--        & 3.7 $\pm$ 0.08&  --         &  --          \\
51~640.5&   2.3    $\pm$ 0.05 &--        & 3.57 $\pm$ 0.07&  --         &  --          \\
51~659.8&   2.63   $\pm$ 0.06 &20.19 $\pm$ 0.73& 3.6 $\pm$ 0.08&  1.88 $\pm$ 0.055&  1.156 $\pm$ 0.054\\
51~660.8&   2.61   $\pm$ 0.06 &19.04 $\pm$ 0.69& 3.56 $\pm$ 0.07&  1.943 $\pm$ 0.056&  1.144 $\pm$ 0.054\\
51~676.4&   1.88   $\pm$ 0.04 &--        & 3.23 $\pm$ 0.07&  --         &  --          \\
51~689.7&   1.95   $\pm$ 0.04 &17.89 $\pm$ 0.64& 3.09 $\pm$ 0.06&  1.678 $\pm$ 0.049&  0.649 $\pm$ 0.031\\
51~690.7&   1.92   $\pm$ 0.04 &19.68 $\pm$ 0.71& 3.01 $\pm$ 0.06&  1.528 $\pm$ 0.044&  0.711 $\pm$ 0.033\\
51~736.4&   2.31   $\pm$ 0.05 &--        & 3.22 $\pm$ 0.07&  --         &  --          \\
51~755.3&   2.72   $\pm$ 0.06 &--        & 3.35 $\pm$ 0.07&  --         &  --          \\
51~869.6&   1.86   $\pm$ 0.04 &--        & 3.84 $\pm$ 0.08&  2.061 $\pm$ 0.060&  0.844 $\pm$ 0.040\\
51~878.6&   1.51   $\pm$ 0.03 &--        & 3.14 $\pm$ 0.07&  1.687 $\pm$ 0.049&  0.918 $\pm$ 0.043\\
51~895.9&   1.7    $\pm$ 0.04 &15.92 $\pm$ 0.57& 2.49 $\pm$ 0.05&  1.203 $\pm$ 0.035&  0.71 $\pm$ 0.033\\
51~897  &   1.7    $\pm$ 0.04 &16.61 $\pm$ 0.60& 2.55 $\pm$ 0.05&  1.18 $\pm$ 0.034&  0.698 $\pm$ 0.033\\
51~898  &   1.79   $\pm$ 0.04 &16.22 $\pm$ 0.58& 2.64 $\pm$ 0.06&  1.2  $\pm$ 0.035&  0.806 $\pm$ 0.038\\
51~936.5&   1.79   $\pm$ 0.07:&20.81 $\pm$ 0.60& --      &  --         &  --          \\
51~937.5&   1.79   $\pm$ 0.07 &--        & 2.96 $\pm$ 0.05&  --         &  --          \\
51~940.6&   1.81   $\pm$ 0.07 &18.73 $\pm$ 0.54& 2.91 $\pm$ 0.05&  --         &  --          \\
51~943.5&   1.76   $\pm$ 0.07 &20.09 $\pm$ 0.58& 2.94 $\pm$ 0.05&  --         &  --          \\
51~952.4&   1.31   $\pm$ 0.05 &--        & 2.75 $\pm$ 0.04&  --         &  --          \\
51~981.7&   1.71   $\pm$ 0.06 &14.31 $\pm$ 0.41& 2.32 $\pm$ 0.04&  1.11 $\pm$ 0.047&  0.625 $\pm$ 0.008\\
52~013.3&   2.24   $\pm$ 0.09 &15.86 $\pm$ 0.46& 2.47 $\pm$ 0.04&  --         &  --          \\
52~016.4&   2.6    $\pm$ 0.10 &17.27 $\pm$ 0.50& 2.63 $\pm$ 0.04&  --         &  --          \\
52~029.5&   1.78   $\pm$ 0.07 &--        & 2.79 $\pm$ 0.04&  --         &  --          \\
52~034.6&   1.8    $\pm$ 0.07 &12.97 $\pm$ 0.38& 2.46 $\pm$ 0.04&  1.127 $\pm$ 0.047&  0.684 $\pm$ 0.009\\
52~036.4&   1.93   $\pm$ 0.07 &--        & 2.61 $\pm$ 0.04&  1.217 $\pm$ 0.051&  0.86 $\pm$ 0.011\\
52~041.8&   1.83   $\pm$ 0.07 &13.31 $\pm$ 0.39& 2.26 $\pm$ 0.04&  1.107 $\pm$ 0.046&  0.696 $\pm$ 0.009\\
52~043.7&   1.99   $\pm$ 0.08 &13.71 $\pm$ 0.40& 2.25 $\pm$ 0.04&  1.155 $\pm$ 0.049&  0.608 $\pm$ 0.008\\
52~074.7&   2.68   $\pm$ 0.10 &17.38 $\pm$ 0.50& 3.41 $\pm$ 0.05&  1.667 $\pm$ 0.070&  0.687 $\pm$ 0.009\\
52~075.7&   2.84   $\pm$ 0.11 &15.08 $\pm$ 0.44& 3.13 $\pm$ 0.05&  1.539 $\pm$ 0.065&  0.798 $\pm$ 0.010\\
52~237.6&   3.34   $\pm$ 0.13 &21.66 $\pm$ 0.63& 5.06 $\pm$ 0.08&  2.221 $\pm$ 0.093&  1.432 $\pm$ 0.019\\
52~238  &   3.33   $\pm$ 0.13 &--        & 5.12 $\pm$ 0.08&  --         &  --          \\
52~239  &   3.33   $\pm$ 0.13:&20.55 $\pm$ 0.60& --      &  --         &  --          \\
52~297.6&   3.45   $\pm$ 0.07 &--        & 4.23 $\pm$ 0.16&  --         &  --          \\
52~299.4&   3.68   $\pm$ 0.08 &19.87 $\pm$ 0.54& 3.95 $\pm$ 0.15&  --         &  --          \\
52~327.4&   3.21   $\pm$ 0.07 &--        & 3.86 $\pm$ 0.15&  --         &  --          \\
52~327.5&   3.14   $\pm$ 0.07 &--        & 3.89 $\pm$ 0.15&  1.35 $\pm$ 0.073&  0.988 $\pm$ 0.055\\
52~338.7&   4.17   $\pm$ 0.09 &19.93 $\pm$ 0.54& 3.99 $\pm$ 0.16&  1.773 $\pm$ 0.096&  1.378 $\pm$ 0.077\\
52~339.7&   4.17   $\pm$ 0.09:&21.14 $\pm$ 0.57& --      &  --         &  --          \\
52~340.8&   3.96   $\pm$ 0.08 &--        & 4.42 $\pm$ 0.17&  --         &  --          \\
52~350.8&   2.74   $\pm$ 0.06 &--        & 4.03 $\pm$ 0.16&  1.666 $\pm$ 0.090&  0.755 $\pm$ 0.042\\
52~367.7&   3.94   $\pm$ 0.08 &--        & 3.83 $\pm$ 0.15&  --         &  --          \\
52~368.7&   3.94   $\pm$ 0.08:&19.06 $\pm$ 0.51& --      &  --         &  --          \\
52~369.7&   3.79   $\pm$ 0.08 &19.39 $\pm$ 0.52& 3.73 $\pm$ 0.15&  1.605 $\pm$ 0.087&  0.863 $\pm$ 0.048\\
52~370.7&   3.91   $\pm$ 0.08 &19.29 $\pm$ 0.52& 3.93 $\pm$ 0.15&  1.671 $\pm$ 0.090&  0.911 $\pm$ 0.051\\ 
52~397.7&   3.3    $\pm$ 0.07 &--        & 3.89 $\pm$ 0.15&  1.368 $\pm$ 0.074&  0.622 $\pm$ 0.035\\
52~398.7&   3.3    $\pm$ 0.07:&18.82 $\pm$ 0.51& --      &  --         &  --          \\
52~399.7&   3.27   $\pm$ 0.07 &--        & 3.72 $\pm$ 0.15&  1.347 $\pm$ 0.073&  0.568 $\pm$ 0.032\\
52~411.4&   3.84   $\pm$ 0.08 &--        & 4.04 $\pm$ 0.16&  --         &  --          \\
52~427.7&   3.72   $\pm$ 0.08 &--        & 4   $\pm$ 0.17&  1.447 $\pm$ 0.078&  0.693 $\pm$ 0.039\\
52~429.7&   3.71   $\pm$ 0.08 &20.55 $\pm$ 0.55& 4.34 $\pm$ 0.17&  1.718 $\pm$ 0.093&  0.762 $\pm$ 0.043\\
52~430.7&   3.75   $\pm$ 0.08 &--        & 4.04 $\pm$ 0.16&  --         &  --          \\ 
52~450.4&   4.24   $\pm$ 0.09 &21.93 $\pm$ 0.59& 4.5 $\pm$0.18&  1.571 $\pm$ 0.085&  1.325 $\pm$ 0.074\\
52~620  &   3.36   $\pm$ 0.07 &--        & 4.29 $\pm$ 0.17&  --         &  --          \\
52~621  &   3.36   $\pm$ 0.07:&19.15 $\pm$ 0.52& --      &  --         &  --          \\
52~622  &   3.44   $\pm$ 0.07 &19.95 $\pm$ 0.54& 4.32 $\pm$ 0.17&  1.914 $\pm$ 0.103&  0.769 $\pm$ 0.043\\
52~623  &   3.58   $\pm$ 0.08 &--        & 4.76 $\pm$ 0.19&  --         &  --          \\
52~665  &   5.07   $\pm$ 0.17 &--        & 4.79 $\pm$ 0.14&  --         &  --          \\
52~665.9&   5.07   $\pm$ 0.17:&24.08 $\pm$ 0.67& --      &  --         &  --          \\
52~666.9&   5.07   $\pm$ 0.17 &22.26 $\pm$ 0.62& 4.79 $\pm$ 0.14&  2.027 $\pm$ 0.097&  1.21 $\pm$ 0.092\\
52~667.9&   5.57   $\pm$ 0.18 &23.24 $\pm$ 0.65& 4.96 $\pm$ 0.14&  2.246 $\pm$ 0.108&  1.364 $\pm$ 0.104\\
52~723.8&   4.54   $\pm$ 0.15 &--        & 5.35 $\pm$ 0.16&  2.304 $\pm$ 0.111&  1.227 $\pm$ 0.093\\
52~724.8&   4.17   $\pm$ 0.14 &22.59 $\pm$ 0.63& 4.96 $\pm$ 0.14&  2.277 $\pm$ 0.109&  1.369 $\pm$ 0.104\\
52~725.8&   4.17   $\pm$ 0.14:&21.54 $\pm$ 0.60& --      &  --         &  --          \\
52~739.7&   5.17   $\pm$ 0.17:&23.31 $\pm$ 0.65& --      &  --         &  --          \\
52~740.8&   5.17   $\pm$ 0.17 &--        & 5.97 $\pm$ 0.17&  2.729 $\pm$ 0.131&  1.347 $\pm$ 0.102\\
52~741.8&   5.15   $\pm$ 0.17 &23.5 $\pm$ 0.66& 5.36 $\pm$ 0.16&  2.603 $\pm$ 0.125&  1.65 $\pm$ 0.125\\
52~743.3&   5.15   $\pm$ 0.17:&22.47 $\pm$ 0.63& --      &  --         &  --          \\
52~768.4&   5.16   $\pm$ 0.17 &--        & 5.67 $\pm$ 0.16&  --         &  --          \\
52~768.3&   5.08   $\pm$ 0.17 &--        & 5.44 $\pm$ 0.16&  2.173 $\pm$ 0.104&  1.277 $\pm$ 0.097\\
52~769.3&   5.33   $\pm$ 0.18 &24.39 $\pm$ 0.68& 5.57 $\pm$ 0.16&  2.064 $\pm$ 0.099&  1.353 $\pm$ 0.103\\
52~770.3&   5.33   $\pm$ 0.18:&23.29 $\pm$ 0.65& --      &  --         &  --          \\
52~782.7&   5.03   $\pm$ 0.17 &24.98 $\pm$ 0.70& 5.82 $\pm$ 0.17&  2.488 $\pm$ 0.119&  1.387 $\pm$ 0.105\\
52~783.8&   5.17   $\pm$ 0.17 &--        & 5.47 $\pm$ 0.16&  2.714 $\pm$ 0.130&  1.374 $\pm$ 0.104\\
52~784.7&   5.55   $\pm$ 0.17:&23.56 $\pm$ 0.66& --      &  --         &  --          \\
52~785.7&   5.55   $\pm$ 0.18 &--        & 5.31 $\pm$ 0.15&  --         &  --          \\
52~812.8&   4.18   $\pm$ 0.14 &--        & 5.74 $\pm$ 0.17&  2.467 $\pm$ 0.118&  1.429 $\pm$ 0.109\\
52~813.7&   4.18   $\pm$ 0.14:&22.76 $\pm$ 0.64& --      &  --         &  --          \\
52~965.6&   3.68   $\pm$ 0.12 &--        & 4.79 $\pm$ 0.14&  --         &  --          \\
52~966.6&   3.46   $\pm$ 0.11 &--        & 4.87 $\pm$ 0.14&  2.428 $\pm$ 0.117&  1.371 $\pm$ 0.104\\
52~967.9&   3.3    $\pm$ 0.11 &--        & 4.83 $\pm$ 0.14&  2.709 $\pm$ 0.130&  1.588 $\pm$ 0.121\\
52~995.6&   3.52   $\pm$ 0.12 &--        & 5.55 $\pm$ 0.16&  2.504 $\pm$ 0.120&  2.258 $\pm$ 0.172\\
53~032.9&   3.26   $\pm$ 0.09 &--        & 4.38 $\pm$ 0.10&  2.111 $\pm$ 0.082&  0.849 $\pm$ 0.062\\
53~053  &   3.19   $\pm$ 0.09 &20.35 $\pm$ 0.53& 4.92 $\pm$ 0.11&  2.405 $\pm$ 0.094&  1.4  $\pm$ 0.102\\
53~081.8&   2.76   $\pm$ 0.08 &--        & 4.18 $\pm$ 0.10&  1.861 $\pm$ 0.073&  0.695 $\pm$ 0.051\\
53~082.7&   2.76   $\pm$ 0.08:&17.91 $\pm$ 0.47& --      &  --         &  --          \\
53~107.6&   2.03   $\pm$ 0.06:&16.54 $\pm$ 0.43& --      &  --         &  --          \\
53~108.7&   2.03   $\pm$ 0.06 &--        & 3.04 $\pm$ 0.70&  1.432 $\pm$ 0.056&  0.452 $\pm$ 0.033\\
53~109.7&   2.03   $\pm$ 0.06:&16.14 $\pm$ 0.42& --      &  --         &  --          \\
53~145.7&   1.92   $\pm$ 0.05 &--        & 2.64 $\pm$ 0.06&  1.18 $\pm$ 0.046&  0.585 $\pm$ 0.043\\
53~146.7&   1.92   $\pm$ 0.05:&14.7 $\pm$ 0.38& --      &  --         &  --          \\
53~168.7&   2.29   $\pm$ 0.07 &--        & 2.74 $\pm$ 0.06&  1.088 $\pm$ 0.042&  0.601$\pm$ 0.044\\
53~169.7&   2.29   $\pm$ 0.07:&14.21 $\pm$ 0.37& --      &  --         &  --          \\
53~173.7&   2.7    $\pm$ 0.08 &--        & 2.76 $\pm$ 0.06&  1.338 $\pm$ 0.052&  0.607 $\pm$ 0.044\\
53~355  &   2.85   $\pm$ 0.08 &--        & 3.72 $\pm$ 0.09&  1.618 $\pm$ 0.063&  0.857 $\pm$ 0.061\\
53~356  &   2.85   $\pm$ 0.08:&18.13 $\pm$ 0.47& --      &  --         &  --          \\
53~357.6&   2.85   $\pm$ 0.08 &18.91 $\pm$ 0.49& 3.71 $\pm$ 0.09&  1.466 $\pm$ 0.057&  0.799 $\pm$ 0.058\\
53~361.5&   2.81   $\pm$ 0.08 &17.85 $\pm$ 0.46& 3.48 $\pm$ 0.08&  1.481 $\pm$ 0.058&  0.616 $\pm$ 0.045\\
53~386.9&   2.56   $\pm$ 0.06 &19.21 $\pm$ 0.52& 3.84 $\pm$ 0.08&  1.736 $\pm$ 0.057&  0.756 $\pm$ 0.056\\
53~388  &   2.57   $\pm$ 0.06 &--        & 3.79 $\pm$ 0.08&  1.692 $\pm$ 0.056&  0.625 $\pm$ 0.046\\
53~388.9&   2.57   $\pm$ 0.06:&17.64 $\pm$ 0.48& --      &  --         &  --          \\
53~408.8&   2.3    $\pm$ 0.06:&16.94 $\pm$ 0.46& --      &  --         &  --          \\
53~416.9&   2.04   $\pm$ 0.05 &--        & 2.96 $\pm$ 0.06&  1.294 $\pm$ 0.043&  0.639 $\pm$ 0.047\\
53~417.5&   2.04   $\pm$ 0.05:&16.36 $\pm$ 0.44& --      &  --         &  --          \\
53~446.8&   1.92   $\pm$ 0.05:&16.16 $\pm$ 0.44& --      &  --         &  --          \\
53~447.8&   1.92   $\pm$ 0.05 &16.62 $\pm$ 0.45& 3.07 $\pm$ 0.06&  1.376 $\pm$ 0.045&  0.716 $\pm$ 0.053\\
53~451.3&   2.14   $\pm$ 0.05 &16.8 $\pm$ 0.45& 3.1 $\pm$ 0.06&  --         &  --          \\
53~474.4&   1.73   $\pm$ 0.05:&14.01 $\pm$ 0.38& --      &  --         &  --          \\
53~475.8&   1.73   $\pm$ 0.04 &--        & 2.47 $\pm$ 0.05&  1.014 $\pm$ 0.033&  0.62 $\pm$ 0.046\\
53~476.8&   1.73   $\pm$ 0.04:&13.97 $\pm$ 0.38& --      &  --         &  --          \\
53~477.3&   1.78   $\pm$ 0.04:&15.77 $\pm$ 0.43& --      &  --         &  --          \\
53~478.7&   1.83   $\pm$ 0.04 &15.08 $\pm$ 0.41& 2.42 $\pm$ 0.05&  1.071 $\pm$ 0.035&  0.684 $\pm$ 0.051\\
53~503.3&   2.16   $\pm$ 0.05 &14.79 $\pm$ 0.40& 2.51 $\pm$ 0.05&  --         &  --          \\
53~503.7&   2.16   $\pm$ 0.05 &--        & 2.74 $\pm$ 0.05&  1.241 $\pm$ 0.041&  0.796 $\pm$ 0.059\\ 
53~504.7&   2.16   $\pm$ 0.05:&14.65 $\pm$ 0.40& --      &  --         &  --          \\
53~507.4&   2.1    $\pm$ 0.05 &15.76 $\pm$ 0.43& 2.6 $\pm$ 0.05&  --         &  --          \\
53~530.7&   1.89   $\pm$ 0.05 &15.07 $\pm$ 0.41& 2.62 $\pm$ 0.05&  1.168 $\pm$ 0.039&  0.681 $\pm$ 0.050\\
53~531.6&   1.94   $\pm$ 0.05 &--        & 2.74 $\pm$ 0.05&  --         &  --          \\
53~531.6&   1.94   $\pm$ 0.05:&14.92 $\pm$ 0.40& --      &  --         &  --          \\
53~538.3&   1.74   $\pm$ 0.04 &13.25 $\pm$ 0.36& 2.49 $\pm$ 0.05&  1.207 $\pm$ 0.040&  0.93 $\pm$ 0.069\\
53~703  &   3.73   $\pm$ 0.09 &18.92 $\pm$ 0.51& 4.42 $\pm$ 0.09&  --         &  --          \\
53~704  &   3.57   $\pm$ 0.09 &--        & 4.44 $\pm$ 0.09&  1.577 $\pm$ 0.052&  1.357 $\pm$ 0.100\\
53~711  &   3.04   $\pm$ 0.07 &--        & 4.3 $\pm$0.09&  2.071 $\pm$ 0.068&  1.036 $\pm$ 0.077\\
53~712  &   2.79   $\pm$ 0.07 &--        & 4.32 $\pm$ 0.09&  2.197 $\pm$ 0.073&  1.01 $\pm$ 0.075\\
53~732  &   2.41   $\pm$ 0.06 &15.84 $\pm$ 0.43& 3.49 $\pm$ 0.07&  1.733 $\pm$ 0.057&  0.904 $\pm$ 0.067\\
53~733  &   2.45   $\pm$ 0.06 &16.01 $\pm$ 0.43& 3.39 $\pm$ 0.07&  --         &  --          \\
53~756.9&   1.88   $\pm$ 0.05 &--        & 3.14 $\pm$ 0.05&  --         &  --          \\
53~757.9&   1.92   $\pm$ 0.05 &--        & 3.16 $\pm$ 0.05&  --         &  --          \\
53~760.5&   1.8    $\pm$ 0.04 &15.62 $\pm$ 0.33& 2.81 $\pm$ 0.04&  --         &  --          \\
53~761.5&   1.82   $\pm$ 0.04 &16.59 $\pm$ 0.35& 2.89 $\pm$ 0.05&  1.372 $\pm$ 0.091&  0.845 $\pm$ 0.073\\
53~786.9&   2.07   $\pm$ 0.05 &15.64 $\pm$ 0.33& 3.16 $\pm$ 0.05&  1.69 $\pm$ 0.112&  0.767 $\pm$ 0.066\\
53~787.5&   1.91   $\pm$ 0.05 &16.57 $\pm$ 0.35& 3.31 $\pm$ 0.05&  1.775 $\pm$ 0.117&  0.982 $\pm$ 0.084\\
53~788.5&   1.94   $\pm$ 0.05 &16.39 $\pm$ 0.34& 3.31 $\pm$ 0.05&  1.544 $\pm$ 0.102&  0.876 $\pm$ 0.075\\
53~789.5&   1.94   $\pm$ 0.05:&16.55 $\pm$ 0.35& --      &  1.724 $\pm$ 0.114&  1.027 $\pm$ 0.088\\
53~803.8&   3.25   $\pm$ 0.08 &16.9 $\pm$ 0.35& 3.43 $\pm$ 0.05&  1.684 $\pm$ 0.111&  1.087 $\pm$ 0.093\\
53~816.4&   3.22   $\pm$ 0.08 &17.83 $\pm$ 0.37& 3.98 $\pm$ 0.06&  1.843 $\pm$ 0.122&  1.471 $\pm$ 0.127\\ 
53~817.4&   3.06   $\pm$ 0.07 &17.79 $\pm$ 0.37& 4.04 $\pm$ 0.06&  1.755 $\pm$ 0.116&  1.571 $\pm$ 0.135\\
53~843.7&   3.53   $\pm$ 0.08 &19.68 $\pm$ 0.41& 4.55 $\pm$ 0.07&  2.34 $\pm$ 0.154&  1.407 $\pm$ 0.121\\
53~844.8&   3.41   $\pm$ 0.08 &--        & 4.52 $\pm$ 0.07&  2.071 $\pm$ 0.137&  1.458 $\pm$ 0.125\\
53~845.7&   3.32   $\pm$ 0.08 &--        & 4.38 $\pm$ 0.07&  2.054 $\pm$ 0.136&  1.58 $\pm$ 0.136\\
53~846.4&   3.31   $\pm$ 0.08 &19.01 $\pm$ 0.40& 4.6 $\pm$0.07&  2.083 $\pm$ 0.137&  1.887 $\pm$ 0.162\\
\end{tabular}
\end{table}