\begin{table}
\caption{Corrections for the seeing effects, for aperture
$4.2''\times19.8 ''$. Columns: 1 -- Seeing intervals in arcsec; 2 --
mean seeing in arcsec; 3 -- our seeing correction for the emission
lines fluxes, $ks$(our); 4 -- the estimated seeing correction error,
$e(ks)$; 5 -- Peterson's seeing correction $ks$(Pet) for the emission
lines fluxes from Peterson et~al. (1995), $ks$(Pet); 6 -- our host
galaxy seeing correction for the continuum fluxes, in units of
$10^{-14}$~erg~s$^{-1}$~cm$^{-2}$~\AA$^{-1}$), $Gs$(our); 7 --
the estimated host galaxy seeing correction error, $e$($Gs$); 8 --
Peterson's host galaxy seeing correction $Gs$(Pet) for the
continuum fluxes from Peterson et~al. (1995). } \label{tab5}
%\centering
 \begin{tabular}{llllllll} \hline \hline
 Interval  & Mean    &$ks$(our)&$\pm$$e$     &$ks$(Pet)   &$Gs$(our)&$\pm$$e$    &$Gs$(Pet)\\
 seeings   &seeing   &H$\beta$&   &H$\beta$        &10$^{-14}$ &&10$^{-14}$    \\
 arcsec    &arcsec   &($4.2''\times19.8'' $)&   &($5''\times7.5''$) &($4.2''\times19.8''$) & &($2''\times10''$)  \\
\hline\noalign{\smallskip}
 2$''$$-$4$''$     &3$''$      &1.000  &        &1.000    &0.000  &         &0.000     \\
 4$''$$-$6$''$      &5$''$      &1.063  &$\pm$0.022   &1.004    &0.031  &$\pm$0.232    &0.123     \\
 4$''$$-$8$''$      &6$''$       &1.080  &$\pm$0.035   &1.015    &0.188  &$\pm$0.292    &          \\
   6$''$$-$8$''$      &7$''$       &1.116  &        &         &       &         &          \\
            &        &       &        &         &0.503  &         &0.245     \\
\hline
\end{tabular}
\end{table}