\begin{table}
\caption{Correction for
seeing effects, for apertures $2''\times6''$ and $2.5''\times6''$.
Columns: 1 -- seeing intervals in arcsec; 2 -- mean seeing in arcsec;
3 -- our seeing correction for the emission lines fluxes, $ks$(our);
4 --  estimated seeing correction error, $e$($ks$); 5 -- Peterson's
seeing correction  for the emission lines fluxes from
Peterson et~al. (1995), $ks$(Pet); 6 -- our host galaxy seeing
correction for the continuum fluxes, in units of $10^{-14}$~erg~s$^{-1}$~cm$^{-2}$~\AA$^{-1}$, $Gs$(our); 7 --  estimated
host galaxy seeing correction error, $e$($Gs$);  8 -- Peterson's host
galaxy seeing correction $Gs$(Pet) for the continuum fluxes from
Peterson et~al. (1995). }
\par
\label{tab4}
%\centering
\par
\begin{tabular}{llllllll}
\hline \hline
  Interval &  Mean    &$ks$(our)&$\pm$e     &$ks$(Pet)  &$Gs$(our)&$\pm$$e$   &$Gs$(Pet)  \\
  seeings  & seeing   &($2''\times6''$)&        &($2'' \times10''$) &($2''\times6''$)&      &($2''\times10''$)         \\
  arcsec   & arcsec   &H$\beta$ wings &      & H$\beta$      &10$^{-14}$      & &10$^{-14}$   \\
%\hline
%    1      &   2      & 3    & 4        &5     & 6     & 7       &8             \\
\hline\noalign{\smallskip}
  1$''$$-$1.5$''$  &  1.25$''$   &0.965 &0.046     &       &--0.160 &0.197  &--0.070 (1.3$''$)  \\
           &  1.5$''$    &0.977*&          &0.973  &       &       &               \\
  1.5$''$$-$2.5$''$ &  2.0$''$    &1.000 &          &1.000  & 0     &       & 0             \\
  2.5$''$$-$3.5$''$&  3.0$''$     &1.042 &0.030     &1.052  &--0.039 &       & 0.130         \\
  3.5$''$$-$4.5$''$&  4.0$''$    &1.069 &0.063     &1.086  &       &       &               \\
  3.5$''$$-$5.2$''$&          &      &          &       & 0.329 &0.203  &               \\
           &  5$''$      &1.096 &          &1.105  &       &       & 0.31          \\
\hline
\end{tabular}
\end{table}