\begin{table}%T5
  \caption{\label{TabPhaseFitParams}Fit parameters for the spectral model HIGHECUT,
             Model A in Table~\ref{TabFitParams}.
             In the last line the fit parameters for the second
             phase interval are given for the same model, but
             multiplied by a cyclotron absorption$^{{a}}$.
             The uncertainties given are at 90\% confidence level
             for single parameter errors ($\chi^2_{\rm min} +
             2.7$). No systematic errors were considered.}
\par
  \small
  %\centerline
$$
  \begin{tabular}{r @{--} l c c c c c c c}
    \hline \hline\noalign{\smallskip}
           \multicolumn{2}{c}{Phase} &  Red.~$\chi^2$ & d.o.f. & $\Gamma$ & Normalisation at 1~keV              &  Cutoff energy & Folding energy \\
           \multicolumn{2}{c}{}      &                &     &          & [$10^{-2}$ (keV cm$^{2}$ s)$^{-1}$] &  [keV]         & [keV]          \\
    \hline\noalign{\smallskip}
           0.025 & 0.25   &  0.99 & 68 &  1  &  $\rm 6.1_{-0.3}^{+0.5}$ & $\rm 20.1_{-0.3}^{+0.6}$ & $\rm 21.4_{-0.3}^{+0.6}$  \\
           0.25  & 0.5    &  1.30 & 68 &  1  &  $\rm 6.2_{-0.2}^{+0.4}$ & $\rm 22.0_{-0.3}^{+0.5}$ & $\rm 18.1_{-0.3}^{+0.5}$  \\
           0.5   & 0.75   &  1.02 & 68 &  1  &  $\rm 5.4_{-0.2}^{+0.5}$ & $\rm 22.1_{-0.3}^{+0.6}$ & $\rm 18.7_{-0.3}^{+0.6}$  \\
           0.75  & 1.025  &  1.26 & 68 &  1  &  $\rm 4.2_{-0.1}^{+0.2}$ & $\rm 23.2_{-0.3}^{+0.6}$ & $\rm 17.1_{-0.3}^{+0.6}$  \\
   \noalign{\smallskip} \hline\noalign{\smallskip}
           0.25  & 0.5    &  1.03 & 68 &  1  &  $\rm 6.4_{-0.2}^{+0.5}$ & $\rm 20.9_{-0.9}^{+1.9}$ & $\rm 19.1_{-0.3}^{+0.5}$  \\
 \hline
  \end{tabular}$$
\smallskip 
    $^{{a}}$ The cyclotron line parameters
             (XSPEC model \texttt{cyclabs}) were: energy 49.3~keV,
             width 5.4~keV, depth 0.136. These parameters were
             fixed after fitting them to a spectral range of
             $20{-}60$~keV, so that for the fit parameters shown in
             the last line also a d.o.f. value of 68 is valid.
\end{table}