\begin{table}%t6
\caption{The best-fit parameters with the relative marginalized errors for the
twelve-image SIS+ES model.}
\label{table:5}
%\centering
\small
\begin{tabular}{c c c}
\hline\hline 
$\theta_{{\rm E}}$ (\arcsec) & $\gamma$ & $\theta_{\gamma}$ (\degr) \\ 
\hline
$1.26 \pm 0.02$ & $0.179 \pm 0.011$ &
$26.4 \pm 1.1$ \\ 
\hline
\end{tabular}
\end{table}