\begin{table}%t2
\caption{The probability that a novae is detectable with BAT, for each of  four energy bins. Results are for the spatial distribution of model~1 in Table~\ref{table_Jean2000}. Other distribution models give very similar results  (see text for details).} 
\label{rates_detect}
\par
%\centering
\small
 {
\begin{tabular}{ccccc}
\hline \hline
Nova type & \multicolumn{4}{c}{Detection probabilities} \\
proportions & 14$-$25 keV & 25$-$50 keV & 50$-$100 keV & 100$-$200 keV \\
\hline \\
100\% ONe                    & 0        &   0.02 \%   &   0.12\% &   0.10\% \\
100\% CO		     & 0.007\%   &   0.82\%   &   1.95\%  &   1.59\% \\
25\% ONe + 75\% CO	     & 0.004\%	&   0.63\%   &   1.55\%  &   1.25\% \\
\hline  
\end{tabular}}
\end{table}