\begin{table}%t2
\caption{Median values of duration, observed peak flux density and relative peak flux density for all frequencies and source classes. Number of flares used to calculate the value is also shown.}
\label{table:parameters}
%\centering
\small
\begin{tabular}{lcc|cc|cc|cc|cc}
\hline
\hline
$\nu$ [GHz]	  & \multicolumn{10}{c}{Median duration [yr]}	  	  \\
 	  & 	 All 	  & 	 $N$ 	  & 	 BLO 	  & 	 $N$ 	  & 	 GAL  	  & 	 $N$ 	  & 	 HPQ  	  & 	 $N$ 	  & 	 LPQ 	  & 	 $N$ 	  \\
\hline 
 4.8 	  & 	 2.9 	  & 	 81 	  & 	 2.7 	  & 	 34 	  & 	 2.8 	  & 	 7 	  & 	 3.0 	  & 	 30 	  & 	 3.6 	  & 	 10 	  \\
 8 	  & 	 2.8 	  & 	 94 	  & 	 2.7 	  & 	 37 	  & 	 2.6 	  & 	 8 	  & 	 2.8 	  & 	 37 	  & 	 3.3 	  & 	 12 	  \\
 14.5 	  & 	 2.5 	  & 	 110 	  & 	 2.4 	  & 	 44 	  & 	 2.2 	  & 	 8 	  & 	 2.5 	  & 	 40 	  & 	 3.1 	  & 	 18 	  \\
 22 	  & 	 2.5 	  & 	 145 	  & 	 2.3 	  & 	 43 	  & 	 2.4 	  & 	 14 	  & 	 2.5 	  & 	 53 	  & 	 2.6 	  & 	 35 	  \\
 37 	  & 	 2.4 	  & 	 150 	  & 	 2.4 	  & 	 43 	  & 	 2.1 	  & 	 15 	  & 	 2.4 	  & 	 56 	  & 	 2.7 	  & 	 36 	  \\
 90 	  & 	 2.3 	  & 	 68 	  & 	 2.5 	  & 	 18 	  & 	 2.1 	  & 	 3 	  & 	 2.1 	  & 	 31 	  & 	 3.0 	  & 	 16 	  \\
 230 	  & 	 2.5 	  & 	 31 	  & 	 2.3 	  & 	 9 	  & 	 $-$ 	  & 	 $-$ 	  & 	 2.8 	  & 	 15 	  & 	 2.5 	  & 	 7 	  \\
\hline 
 $\nu$ [GHz]	  & \multicolumn{10}{c}{Median observed peak flux density [Jy]} 	  \\
	  & 	 All 	  & 	 $N$ 	  & 	 BLO 	  & 	 $N$ 	  & 	 GAL  	  & 	 $N$ 	  & 	 HPQ  	  & 	 $N$ 	  & 	 LPQ 	  & 	 $N$ 	  \\
\hline 
 4.8 	  & 	 4.0 	  & 	 85 	  & 	 3.2 	  & 	 34 	  & 	 5.0 	  & 	 8 	  & 	 3.7 	  & 	 33 	  & 	 8.1 	  & 	 10 	  \\
 8 	  & 	 4.6 	  & 	 99 	  & 	 4.3 	  & 	 38 	  & 	 3.9 	  & 	 8 	  & 	 4.5 	  & 	 41 	  & 	 10.2 	  & 	 12 	  \\
 14.5 	  & 	 5.0 	  & 	 117 	  & 	 4.2 	  & 	 45 	  & 	 3.6 	  & 	 9 	  & 	 5.1 	  & 	 44 	  & 	 10.0 	  & 	 19 	  \\
 22 	  & 	 4.4 	  & 	 153 	  & 	 4.9 	  & 	 45 	  & 	 3.1 	  & 	 15 	  & 	 4.9 	  & 	 56 	  & 	 4.3 	  & 	 37 	  \\
 37 	  & 	 4.6 	  & 	 153 	  & 	 5.1 	  & 	 45 	  & 	 3.1 	  & 	 15 	  & 	 4.6 	  & 	 56 	  & 	 4.4 	  & 	 37 	  \\
 90 	  & 	 4.9 	  & 	 72 	  & 	 4.6 	  & 	 18 	  & 	 3.7 	  & 	 4 	  & 	 5.0 	  & 	 34 	  & 	 8.1 	  & 	 16 	  \\
 230 	  & 	 5.1 	  & 	 33 	  & 	 3.4 	  & 	 9 	  & 	 1.2 	  & 	 1 	  & 	 5.2 	  & 	 16 	  & 	 7.0 	  & 	 7 	  \\
\hline 
 $\nu$ [GHz]	  & \multicolumn{10}{c}{Median relative peak flux density [Jy]} 	  \\
	  & 	 All 	  & 	 $N$ 	  & 	 BLO 	  & 	 $N$ 	  & 	 GAL  	  & 	 $N$ 	  & 	 HPQ  	  & 	 $N$ 	  & 	 LPQ 	  & 	 $N$ 	  \\
\hline 
 4.8 	  & 	 1.8 	  & 	 85 	  & 	 1.7 	  & 	 34 	  & 	 1.1 	  & 	 8 	  & 	 1.8 	  & 	 33 	  & 	 3.8 	  & 	 10 	  \\
 8 	  & 	 2.4 	  & 	 99 	  & 	 2.1 	  & 	 38 	  & 	 1.3 	  & 	 8 	  & 	 2.2 	  & 	 41 	  & 	 5.3 	  & 	 12 	  \\
 14.5 	  & 	 2.7 	  & 	 117 	  & 	 2.4 	  & 	 45 	  & 	 1.6 	  & 	 9 	  & 	 3.1 	  & 	 44 	  & 	 4.6 	  & 	 19 	  \\
 22 	  & 	 2.6 	  & 	 151 	  & 	 2.8 	  & 	 44 	  & 	 1.8 	  & 	 15 	  & 	 2.8 	  & 	 56 	  & 	 2.5 	  & 	 36 	  \\
 37 	  & 	 2.8 	  & 	 151 	  & 	 3.1 	  & 	 44 	  & 	 2.0 	  & 	 15 	  & 	 2.8 	  & 	 56 	  & 	 2.5 	  & 	 36 	  \\
 90 	  & 	 3.1 	  & 	 72 	  & 	 2.8 	  & 	 18 	  & 	 2.4 	  & 	 4 	  & 	 3.6 	  & 	 34 	  & 	 4.8 	  & 	 16 	  \\
 230 	  & 	 3.6 	  & 	 31 	  & 	 1.9 	  & 	 9 	  & 	 $-$ 	  & 	 $-$ 	  & 	 3.6 	  & 	 15 	  & 	 6.2 	  & 	 7 	  \\
\hline 
\end{tabular}
\end{table}