\begin{table}%t3
\caption{\label{tab3}\label{3dcor}The \cobold\ models considered in this work (excluding the solar 
model) for the \ion{Eu}{ii}~spectral line at 664.519~nm: the table reports 
the atmospheric parameters (\Teff/$\log{g}$/[M/H]) 
for each model, the {\it EW} measurement, and the corresponding 3D-\xx\ and 3D-\mD\
\mbox{corrections}.}
\small%\centering
\par
\begin{tabular}{lccc} 
\hline\hline
Model parameters & {\it EW}  & 3D-\xx  & 3D-\mD~  \\ 
(\Teff / $\log g$ / [M/H])& (pm) & (dex) & (dex)   \\
\hline 
  5430/3.5/0.0     & 1.070 & --0.001 &  0.007 \\
  5480/3.5/--1.0 & 0.190 &  0.007 &  0.019 \\
  5930/4.0/0.0     & 0.670 &  0.004 &  0.008 \\
  5850/4.0/--1.0 & 0.110 &  0.009 &  0.023 \\
  4980/4.5/0.0     & 0.400 &  0.000 &  0.009 \\
  5060/4.5/--1.0 & 0.073 &  --0.003 &  0.009 \\
  5870/4.5/0.0     & 0.430 &  0.006 &  0.015 \\
  5929/4.5/--1.0 & 0.066 &  0.011 &  0.021 \\
  6230/4.5/0.0     & 0.400 &  0.009 &  0.017 \\
  6240/4.5/--1.0 & 0.058 &  0.008 &  0.017 \\
  6460/4.5/0.0     & 0.370 &  0.008 &  0.015 \\
  6460/4.5/--1.0 & 0.051 &  0.001 &  0.013 \\
\hline 
\end{tabular}
\end{table}