\begin{table}%t2
\caption{\label{tab2}Solar europium abundances from the adopted observed spectra. Column~(1) 
indicates the solar spectrum used: KF: Kurucz flux, NF: Neckel flux, NI: Neckel 
intensity, DI: Delbouille intensity. Column~(2) is the wavelength of the observed 
lines. Column~(3) is the Equivalent Width. Columns~(4) and~(5) are Eu~abundance from the
\cobold\ models and the corresponding uncertainty due to the error of the 
Equivalent Width. Columns~(6)$-$(9) are the results from the 1D~chemical analysis 
by adopting two solar models (HM: \citet{hm}. FC: ATLAS9 solar model by Fiorella 
Castelli). Finally, Cols.~(10) and~(11) are the 3D~corrections. }
\small%\centering
\par
\begin{tabular}{ccccccccccccccc}  
\hline \hline \noalign{\smallskip}
{Spec} & Wave    & {{\it EW}} &
{3D}  & {$\sigma_{\rm {\it EW}}$} & {1D}& {$N(^{151}$Eu)/$N$(Eu$_{\rm tot})$} &
{1D} & {$N(^{151}$Eu)/$N$(Eu$_{\rm tot})$} &
{3D-\xx} &
{3D-\mD} \\
 &  & & \cobold\ &  & HM & HM & FC & FC & & \\
  & ~nm  &   (pm)   &  (dex)& (dex) & (dex) &  &  (dex) &  &(dex) & (dex)\\
\hline 
KF & 412.972  & 5.620  &  0.509  &  0.045 & 0.535  & 0.54  & 0.526  & 0.51  &	 --0.013     &	 --0.030  \\
NF & 412.972  & 5.652  &  0.513  &  0.045 & 0.527  & 0.49  & 0.513  & 0.48  &	 --0.014     &	 --0.030  \\
NI & 412.972  & 5.026  &  0.537  &  0.050 & 0.533  & 0.51  & 0.537  & 0.49  &	  0.014     &	  0.006  \\
DI & 412.972  & 5.045  &  0.540  &  0.050 & 0.545  & 0.53  & 0.541  & 0.51  &	  0.015     &	  0.006  \\
\hline
KF & 604.951  & 0.063   &  0.504  &  0.030 & 0.528  & --   & 0.539 &  --  &	  0.013     &	 0.002    \\
NF & 604.951  & 0.061   &  0.490  &  0.030 & 0.519  & --   & 0.492 &  --  &	  0.014     &	 0.003     \\
NI & 604.951  & 0.051   &  0.480  &  0.035 & 0.532  & --   & 0.487 &  --  &	  0.023     &	 0.013     \\
DI & 604.951  & 0.057   &  0.529  &  0.035 & 0.537  & --   & 0.521 &  --  &	  0.022     &	 0.012     \\
\hline	 					KF & 664.519  & 0.436   &  0.511  &  0.020 & 0.540  & 0.52  & 0.520 & 0.51  &	  0.011     &	 0.000     \\
NF & 664.519  & 0.432   &  0.507  &  0.020 & 0.531  & 0.49  & 0.520 & 0.47  &	  0.011     &	 0.000     \\
NI & 664.519  & 0.400   &  0.530  &  0.026 & 0.506  & 0.46  & 0.518 & 0.47  &	  0.020     &	 0.010      \\
DI & 664.519  & 0.384   &  0.514  &  0.021 & 0.504  & 0.50  & 0.504 & 0.49  &	  0.020     &	 0.011      \\
\hline	 					DI & 707.709  & 0.082   &  0.526  &  0.032 & 0.480  & --   & 0.472 & --  &	  0.025     &	0.012	   \\
\hline	 					DI & 721.756  & 0.220   &  0.564  &  0.031 & 0.508  & --   & 0.513 & --  &	  0.026     &	0.013	   \\
\hline
\end{tabular}
\end{table}