\begin{table}%t2
\caption{Summary of VISIR observations of newly discovered \textit{INTEGRAL}
sources. We give their MIR fluxes (mJy) in the PAH1 (8.59~$\mu$m), PAH2
(11.25~$\mu$m) and Q2 (18.72~$\mu$m) filters. When we did not detect a source,
we give the upper limit. When no flux nor upper limit is
given, the source was not observed in the considered filter.}\label{tab2}
%\centering
\small
\begin{tabular}{c c c c}
\hline
\hline
Sources & PAH1 & PAH2 & Q2 \\
\hline
IGR~J16195-4945 & $<$6.1 & $<$7.8 & $<$50.3\\
IGR~J16207-5129 & $21.7\pm1.4$ & $9.4\pm1.3$ & $<$53.4\\
IGR~J16318-4848 & $426.2\pm3.0$ & $317.4\pm3.4$ & $180.7\pm15.3$\\
IGR~J16320-4751 & $12.1\pm1.7$ & $6.3\pm1.8$ &\\
IGR~J16358-4726 & $<$6.9 & &\\
IGR~J16418-4532 & $<$5.8 & &\\
IGR~J16465-4507 & $6.9\pm1.1$ & $<$5.0&\\
IGR~J16479-4514 & $10.9\pm1.2$ & $7.0\pm1.6$ &\\
IGR~J17252-3616 & $6.1\pm0.6$ & $<$5.0&\\
IGR~J17391-3021 & $70.2\pm1.6$ & $46.5\pm2.6$ &\\
IGR~J17544-2619 & $46.1\pm2.8$ & $20.2\pm2.1$ &\\
IGR~J19140+0951 & $35.2\pm1.4$ & $19.1\pm1.4$ &\\
\hline
\end{tabular}
\end{table}