\begin{table}%ta.2
\caption{Same as Table~\ref{Table:2}, except the WR2 mass loss rate is used. \label{Table:3}}             % title of Table
%\centering
                          % used for centering table
\begin{tabular}{c c c c c }        % centered columns (4 columns)
\hline\hline                 % inserts double horizontal lines
 ${M_{\rm WR}}$ [${M_{\odot}}$]& ${M_{\rm CC}}$ [${M_{\odot}}$] & $P_{1} $[h] & $P_{2} $[h] & $P_{3} $[h] \\    % table heading 
\hline                        % inserts single horizontal line
   8  & 1.4  & 4.83 & 13.67 & -- \\
   12 & 1.4  & 3.81 & 10.77 & -- \\
   16 & 1.4  & 3.26 & 9.21  & -- \\      % inserting body of the table
   \hline
   8 & 3.0   & 6.54 & 20.02 & -- \\
   12 & 3.0  & 5.27 & 15.76 & -- \\
   16 & 3.0  & 4.56 & 13.48 & -- \\      % inserting body of the table
   \hline
   8 & 5.0   & 7.77 & 25.84 & 2.75 \\
   12 & 5.0  & 6.39 & 20.35 & 2.26 \\
   16 & 5.0  & 5.60 & 17.41 & 1.98 \\      % inserting body of the table
\par
   \hline                                   
\end{tabular}
\end{table}