\begin{table}%t3
\par
  \caption{\label{param_RHya}Parameters of the model with best goodness-of-fit for
    \object{R~Hya}. In the second column the values of the best-fit
    model parameters are listed, in the third column the confidence
    interval around the parameter is specified. The numbers in italics
    are input parameters that have been kept fixed at the given
    values.}
\small%\centering
\par
\begin{tabular}{lll}
\hline \hline
Parameter & Value & Confidence interval \\
\hline
\Teff\ [K] & 2830 & 2400$-$2900 \\
$R_{\star}$ [$10^{13}$~cm] & 3.1 & 2.5$-$3.1 \\
$L_{\star}$ [$10^4$~\Lsun ]  & 1.16 & 0.5$-$1.3 \\
$\varepsilon$(C) [$10^{-4}$]    & \emph{3} & $-$  \\
$\varepsilon$(O) [$10^{-4}$]    & \emph{8.5} & $-$  \\  
distance  [pc] & 165 & 165$-$180 \\
$R_{\rm{inner}}$ [\Rstar] & 150 & 130$-$240 \\
$R_{\rm{outer}}$ [\Rstar] & 2350 & 2000$-$8000 \\
$v_{\infty}$     [km~s$^{-1}$] & 8 & 8$-$9 \\
\Mdot$(r)$ [{\Msun}~yr$^{-1}$] & ${\sim}1 \times 10^{-8}$
($\sim$1$-$150~\Rstar)  & $.8{-}1.2 \times 10^{-8}$\\
 & ${\sim}2 \times 10^{-7}$ ($\sim$150$-$5000~\Rstar) & $1{-}2.2 \times 10^{-7}$\\
    \hline
  \end{tabular}
\end{table}