\begin{table}%t1
\caption{Observational and measurement data. Given are: star name
(observed at $t$ -- Terskol (Russia), $f$~-- FEROS, $H$~-- HARPS La~Silla (Chile),
$b$~-- Bohyunsan (S. Korea), spectral and luminosity class, reddening, $EW$s (in m\AA) of CN and CH~molecules, their calculated column densities (in 10$^{12}$~cm$^{-2}$),
and $EW$s (in m\AA) of diffuse 5797 and 5780~bands with errors in each bracket.
We also designate the  lines of sight  with $EW$$_{\rm CN}$~$>$ 14~m\AA $^{{a}}$ and $EW$$_{\rm CH}$~$>$ 20~m\AA$^{{b}}$. With symbol: we mark lines of sight
with uncertain column density of CN~molecule based on measurements of R(0)~line
and uncertain column densities of CH~molecule based on measurements of saturated CH~A-X
band at 4300~\AA. In the case of the 5797~DIB blended with the stellar C~IV~5801.313~\AA\ line
we avoid the $EW$~measurement as being very uncertain (bl).}\label{tab1}
\par
%\centering
\small
\begin{tabular}{rlrrrrrrrrrrr}
\hline \hline 
HD      &Sp & $E(B-V)$&    CN(R1)&    CN(R0)  &   CN(P1)  & CH(3886)&   CH(3890)&   CH(4300)&   $N$(CN)                 &   $N$(CH)   &   $EW$(5780)&   $EW$(5797) \\ 
\hline
12953$^{t}$ &A1Iae  & 0.60  & 12.8(0.5)&    28.5(1.5)&  6.2(0.7)&       &       &   13.5(1.3)&  16.53(0.50)${^{a}}$& 16.30(1.57)&    221(3.9)&   58.3(1.7)\\
13854$^{t}$ &B1Iabe & 0.47  &          &    3.1(1.1)&           &       &       &   17.3(1.2)&  0.68(0.24):           & 20.89(1.45)&    270(5.3)&   75.9(2.0)   \\
14143$^{t}$ &B2Ia   & 0.68  & 3.6(0.7) &    13.0(0.6)&  1.5(0.2)&       &       &   17.1(1.3)&  4.05(0.36)           & 20.65(1.57)&     291(5.4)&   92.8(2.9)   \\
20041$^{t}$ &A0Ia   & 0.69  & 2.5(0.2) &    12.1(0.9)&  1.8(0.3)&   5.2(0.2)&       &   21.7(0.4)&  3.49(0.26)       & 26.21(0.48)&    397(7.7)&   106(3.0)\\
21291$^{t}$ &B9Ia   & 0.41  & 2.6(0.2) &    8.4(0.2)&   1.6(0.3)&  4.1(0.8)&          &   17.0(0.3)&  2.67(0.11)   & 20.53(0.36)&    178(5.1)&   60.5(1.5)\\
23180$^{b}$ &B1III  & 0.27  & 1.7(0.2) &    5.7(0.4)&   1.2(0.1)&   4.2(0.3)&   3.7(0.2)&   15.0(0.2)&  1.82(0.15)   & 18.11(0.24)&    90.6(1.5)   &66.2(1.9)\\
24398$^{b}$ &B1Iab  & 0.29  & 2.9(0.1) &    10.0(0.5)&  1.6(0.1)&   4.3(0.2)&   2.8(0.2)&   15.8(0.2)&  3.16(0.14)   & 19.08(0.24)&    99.0(1.9)&  58.4(1.7)\\
24534$^{t}$ &O9.5pe & 0.56  & 7.8(0.6) &    16.1(1.0) &  4.6(0.4)&   8.1(0.8)&   5.5(0.3)&   24.6(0.5)&  7.53(0.42)${^{a}}$   & 38.49(0.60)${^{b}}$& 84.2(1.7)&  59.2(1.8)\\
25638$^{t}$ &B0III  & 0.66  &          &    1.0(0.2)&           &   9.5(0.3)&       &   26.0(3.0)&  0.22(0.04):       & 31.40(3.62)&    287(4.7)&   122(3.5)\\
27778$^{b}$ &B3V    & 0.37  & 12.4(0.3)&    32.6(0.7)&  7.1(0.5)&   7.7(0.9)&   5.1(0.6)&   23.3(0.3)&  20.75(0.25)${^{a}}$& 36.14(0.36)${^{b}}$& 90.8(1.6)&  43.2(1.1)\\
34078$^{t}$ &O9.5Ve & 0.49  & 2.8(0.3) &    5.8(0.1)&   1.5(0.1)&   16.2(0.3)&  10.6(0.2)&  50.3(1.8)&  2.20(0.21)   & 75.80(2.17)${^{b}}$& 175(3.6)&   55.3(1.7)\\
45314$^{f}$ &O9:pe  & 0.43  & 2.3(0.2) &    6.5(0.3)&   1.8(0.1)&   4.1(0.1)&           &   13.7(2.0)&  2.19(0.13)   & 16.54(2.41)&    185(3.5)&   59.1(1.9)\\
46150$^{f}$ &O6e    & 0.46  & 1.7(0.3) &    3.9(0.3)&   0.8(0.1)&   3.2(0.1)&   2.3(0.1)&   12.1(0.7)&  1.42(0.17)   & 14.61(0.85)&    342(6.8)&   101(2.9)\\
46223$^{f}$ &O5e    & 0.48  & 1.2(0.2) &    4.7(0.4)&   0.8(0.1)&   7.4(0.2)&   5.2(0.2)&   18.6(1.0)&  1.43(0.15)   & 22.46(1.21)&    347(7.1)&   116(3.4)\\
46573$^{f}$ &O7     & 0.63  & 2.6(0.3) &    9.7(0.5)&   1.0(0.1)&     7.5(0.4)& 5.5(0.3)&   28.1(1.7)&  2.99(0.21)   & 37.09(2.05)${^{b}}$& 329(6.2)&   152(4.3)\\
47432$^{f}$ &O9.5III &0.42  &          &    1.5(0.1)&           &   2.5(0.2)&   1.5(0.2)&   9.7(0.5)&   0.33(0.02):   & 11.71(0.60)&    199(3.7)&   53.6(1.5)\\
48434$^{f}$ &B0III  & 0.21  & 2.3(0.1) &    5.5(0.3)&   1.3(0.1)&   2.3(0.2)&   1.5(0.2)&   8.4(0.2)&   1.97(0.10)   & 10.14(0.24)& 114(2.3)&   38.2(1.2)\\
75149$^{f}$ &B3Ia   & 0.39  & 1.3(0.2) &    3.8(0.3)&   0.7(0.1)&   4.3(0.2)&   3.0(0.5)&   14.7(0.4)&  1.27(0.13)   & 17.75(0.48)&    224(4.0)&   50.9(1.4)\\
80558$^{f}$ &B6Iae  & 0.60  & 2.2(0.3) &    7.1(0.3)&   1.2(0.1)&   6.7(0.2)&   3.8(0.2)&   19.2(0.5)&  2.29(0.17)   & 23.19(0.60)&    393(7.3)&   132(3.8)\\
93130$^{f}$ &O6     & 0.56  &          &    2.5(0.4)&           &       &       &   9.3(0.3)&   0.55(0.09):           & 11.23(0.36)&    252(5.0)&   bl\\
94367$^{f}$ &B9Ia   & 0.17  &          &    0.9(0.1)&           &       &       &   3.3(0.3)&   0.20(0.02):            & 3.99(0.36)&    107(2.5)&   27.0(1.1)   \\
99264$^{f}$ &B2IV-V & 0.27  &          &    0.5(0.1)&           &       &       &   5.5(0.3)&   0.11(0.02):            & 6.64(0.36)&    184(3.4)&   26.9(0.6)\\
99872$^{f}$ &B3V    & 0.34  &          &    3.1(0.2)&           &   2.6(0.2)&   1.7(0.1)&   10.8(0.9)&  0.68(0.04):    & 13.04(1.09)&    174(3.2)&   30.9(0.8)\\
101191$^{f}$&O8     & 0.37  &          &    4.0(0.1)&           &       &       &   7.8(0.5)&   0.88(0.02):            & 9.42(0.60)& 194(2.9)&   51.0(1.2)\\
101205$^{f}$&O8V    & 0.33  &          &    2.6(0.1)&           &   2.2(0.3)&   0.9(0.3)&   6.6(0.3)&   0.57(0.02):    & 7.97(0.35)& 183(3.1)&   bl\\
101223$^{f}$&O7     & 0.45  & 6.1(0.2) &    18.5(0.8)&  3.7(0.2)&   4.1(0.3)&       &   13.5(0.7)&  8.04(0.24)${^{a}}$& 16.30(0.85)&    193(2.7)&   47.8(1.3)\\
104841$^{f}$&B2IV   & 0.09  &          &    0.5(0.1)&           &       &       &   2.9(0.2)&   0.11(0.02):            & 3.50(0.24)& 48.6(0.6)   &   10.4(1.2)\\
110432$^{f}$&B2pe   & 0.48  & 2.1(0.3) &    5.3(0.3)&   1.4(0.2)&   3.5(0.2)&   1.5(0.1)&   12.1(0.4)&  1.86(0.17)    & 14.61(0.48)&    136(2.5)&   34.7(1.0)\\
116072$^{f}$&B2.5Vn & 0.21  & 1.1(0.2) &    2.4(0.3)&           &   1.8(0.2)&   0.8(0.2)&   6.8(0.3)&   0.89(0.13)    & 8.21(0.36)& 101(1.0)&   16.1(0.5)\\
141637$^{f}$&B1.5V  & 0.16  &          &    0.5(0.1)&           &       &       &   1.3(0.1)&   0.11(0.02):            & 1.57(0.12)& 75.6(1.2)&  10.9(0.3)\\
147165$^{H}$&B1III  & 0.34  &          &    0.17(0.01)&        &   0.8(0.2)&       &   2.9(0.1)&   0.04(0.005):       & 3.50(0.12)& 241(4.0)&   34.3(1.0)\\
147888$^{f}$&B3/B4V & 0.46  & 2.2(0.3) &    6.5(0.4)&   1.0(0.1)&   5.4(0.2)&   3.5(0.3)&   17.5(0.5)&  2.16(0.19)    & 21.13(0.60)&    238(5.5)&   56.0(1.6)\\
147889$^{H}$&B2III/IV& 1.00 & 17.4(0.9)&    30.0(1.2)&  9.1(0.5)&   20.2(0.3)&  15.1(0.5)&  50.2(1.7)&  21.87(0.56)${^{a}}$& 100.9(2.48)${^{b}}$& 370(4.7)&   152(4.3)\\
147932$^{f}$&B5V    & 0.47  & 7.2(0.8) &    14.8(0.5)&  4.0(0.3)&   6.4(0.2)&  3.8(0.5)     &   15.9(0.5)&  6.78(0.37)${^{a}}$& 19.20(0.58)&    222(7.0)&   57.5(1.3)\\
147934$^{H}$&B2V    & 0.45  & 2.22(0.05)&  6.47(0.2)& 1.31(0.05)& 5.50(0.08)& 4.22(0.2)&  17.86(1.2)& 2.16(0.26)      & 21.57(0.48)&    207(4.0)&   51.0(1.4)\\
148184$^{H}$&B2Vne  & 0.48  & 1.6(0.1) &    3.7(0.1)&   0.6(0.1)&   7.2(0.2)&   5.2(0.2)&   23.7(0.2)&  1.36(0.09)    & 35.32(0.24)${^{b}}$& 101(2.1)&   46.7(1.4)\\
148379$^{f}$&B2Iab  & 0.77  & 0.5(0.2) &    1.8(0.1)&           &   3.3(0.2)&       &   15.0(0.5)&  0.56(0.09)        & 18.11(0.60)&    413(9.0)&   90.6(2.6)\\
148688$^{f}$&B1Ia   & 0.52  & 0.3(0.1) &    1.4(0.2)&           &   3.6(0.2)&   2.7(0.2)&   14.2(0.6)&  0.41(0.08)    & 17.15(0.70)&    343(9.0)&   85.2(2.5)\\
148937$^{f}$&O6e    & 0.61  & 2.5(0.2) &    9.2(0.3)&   1.3(0.2)&   5.0(0.2)&       &   16.2(0.6)&  2.85(0.13)        & 19.56(0.72)&    353(6.8)&   bl\\
149404$^{f}$&O9Ia   & 0.71  & 2.5(0.4) &    8.7(0.8)&   1.0(0.2)&   5.7(0.1)&   3.2(0.1)&   22.5(0.9)&  2.74(0.31)    & 27.17(1.09)&    389(7.3)&   bl\\
149757$^{H}$&O9.5V  & 0.28  & 2.7(0.3) &    8.2(0.3)&  1.4(0.13)&  5.5(0.2)&   3.6(0.1)&   18.5(0.1)&  2.75(0.17)     & 22.34(0.12)&    78.9(1.1)&  31.4(0.9)\\
150136$^{f}$&O5     & 0.42  &          &    1.6(0.1)&           &       &       &   9.6(0.3)&   0.35(0.02):            & 11.59(0.35)&    232(4.2)&   48.2(1.5)\\
150168$^{f}$&B1Iab/Ib&0.16  &          &    1.5(0.1)&           &   2.4(0.1)&   1.1(0.1)&   8.5(0.2)&   0.33(0.02):    & 10.26(0.23)& 107(1.9)&   29.3(0.8)\\
152076$^{f}$&B0.5III& 0.43  &          &    7.9(0.3)&           &   4.6(0.3)&   3.0(0.3)&   17.9(0.4)&  1.74(0.07):    & 21.62(0.48)&    183(3.2)&   67.8(1.9)\\
152218$^{f}$&O9V    & 0.45  & 1.5(0.2) &    4.1(0.4)&   0.9(0.2)&   4.5(0.2)&   3.3(0.3)&   16.5(0.6)&  1.40(0.15)    & 19.93(0.72)&    181(3.1)&   73.9(1.9)\\
152219$^{f}$&O9IV   & 0.44  &          &    1.0(0.2)&           &   1.8(0.2)&   1.1(0.2)&   10.7(0.5)&  0.22(0.04):    & 12.92(0.59)&    239(4.4)&   53.5(1.7)\\
152233$^{H}$&O6III  & 0.42  & 0.61(0.04)& 1.60(0.06)&           &   3.30(0.07)& 1.71(0.05)& 13.07(0.10)& 0.55(0.03)     & 15.78(0.24)&    225(3.6)&   bl\\
152234$^{f}$&B0.5Ia & 0.40  & 0.7(0.1) &    2.0(0.2)&   0.3(0.1)&   1.9(0.2)&   1.3(0.1)&   12.8(0.3)&  0.67(0.08)    & 15.46(0.35)&    233(3.3)&   65.6(2.0)\\
152235$^{H}$&B0.7Ia & 0.78  & 1.5(0.3)&  3.5(0.2)&   0.6(0.1)   &   8.9(0.4)&   6.2(0.2)&   30.2(0.7)&  1.27(0.14)    & 42.85(1.65)${^{b}}$& 384(7.5)&   95.0(3.1)\\
152236$^{f}$&B1Iape & 0.65  & 2.1(0.3)&  8.3(0.3)&   1.0(0.1)   &   5.0(0.4)&   2.7(0.4)&   22.1(0.5)&  2.52(0.17)    & 26.69(0.61)&    349(7.0)&   111(3.2)\\
152246$^{f}$&O9Ib   & 0.44  & 0.9(0.1)&  1.6(0.2)&   0.5(0.1)   &   4.6(0.2)&   2.3(0.2)&   14.7(0.5)&  0.65(0.08)    & 17.75(0.58)&    227(3.9)&   bl\\
152249$^{H}$&O9Ib   & 0.48  & 1.0(0.2)&  1.8(0.1)&   0.5(0.1)   &   3.4(0.2)&   2.4(0.3)&   11.5(0.2)&  0.73(0.09)    & 13.89(0.24)&    242(3.8)&   bl\\
152314$^{f}$&B0.5Iab& 0.39  & 1.5(0.2)&  3.2(0.2)&   0.8(0.2)   &   5.5(0.2)&   4.2(0.2)&   16.2(0.5)&  1.20(0.11)    & 19.56(0.60)&    257(4.1)&   bl\\
152667$^{f}$&B0.5Iae& 0.47  & 2.4(0.2)&  5.9(0.4)&   1.8(0.3)   &   4.8(0.1)&   3.7(0.1)&   15.4(0.5)&  2.09(0.15)    & 18.60(0.59)&    300(5.6)&   78.5(2.1)\\
154090$^{f}$&B1Iae  & 0.45  & 8.5(0.3)&  18.1(1.0)&  4.5(0.3)   &   7.2(0.3)&   5.8(0.3)&   22.6(0.8)&  8.65(0.32)${^{a}}$    & 37.46(1.77)${^{b}}$& 143(2.7)&   61.3(1.8)\\
154368$^{f}$&O9.5Iab& 0.73  & 16.2(0.5)& 28.9(1.3)&  11.3(0.7)  &  14.5(0.6)&  10.3(0.6)&  41.8(1.1)&  20.03(0.45)${^{a}}$& 70.52(1.33)${^{b}}$&    218(4.2)&   106.4(3.1)\\
154445$^{f}$&B1V    & 0.35  & 1.4(0.2)&  2.4(0.3)&   0.8(0.2)   &   4.8(0.4)&   3.8(0.5)    &   15.5(0.4)&  0.99(0.13)        & 18.72(0.48)&    192(3.9)&   62.1(1.9)\\
163800$^{H}$&O7     & 0.57  & 2.97(0.03)&9.56(0.02)& 1.88(0.01) & 7.1(0.02)& 5.5(0.03)& 22.2(0.7)&  3.08(0.02)        & 36.16(0.94)${^{b}}$& 256(2.0)&107(1.5)\\
164794$^{f}$&O4V    & 0.33  &         &   2.0(0.2)&             &       &       &   6.9(0.3)&   0.44(0.04):            & 8.33(0.35)& 154(2.3)&   40.3(1.4)\\
165688$^{f}$&WN     & 1.00  &5.4(0.2)&  15.7(0.5)&              &   12.1(0.7)&  7.0(0.9)&   38.9(1.7)&  6.57(0.18)${^{a}}$    & 46.98(2.05)&    484(8.1)&   150(4.2)\\
\hline
166734$^{f}$&O8e    & 1.38  &4.5(0.1)&  16.1(0.6)&  2.5(0.3)    &   13.2(0.7)&  9.0(1)  &   44.6(1.6)&  6.44(0.17)${^{a}}$    & 53.86(1.93)&    686(15.0)&  249(8.0)\\
168075$^{f}$&O7V    & 0.74  &2.5(0.4)&  6.6(0.5)&               &       &       &   30.1(1.4)&  2.28(0.24)            & 36.35(1.69)&    465(8.1)&   194(6.1)\\
168137$^{f}$&O8.5V  & 0.68  &4.7(0.6)&  14.2(0.6)&              &       &       &   21.6(1.5)&  5.73(0.33)${^{a}}$            & 26.08(1.81)&    478(8.6)&   152(4.4)\\
168607$^{f}$&B9Ia   & 1.55  &5.2(0.2)&  11.1(0.6)&  3.5(0.3)    &   16.0(1.0)&  7.9(0.7)&   50.4(1.8)&  4.16(0.20)    & 60.86(2.17)&    807(15.6)&  249(9.0)\\
168625$^{f}$&B6Ia   & 1.52  &        &   5.0(0.3)&              &   13.8(0.4)&  7.0(0.2)&   42.7(1.7)&  1.10(0.07):     &  57.15(2.05)${^{b}}$&    810(17.0)&  216(6.3)\\
179406$^{H}$&B3V    & 0.31  &3.51(0.2)& 11.7(0.5)&  1.74(0.03)  & 4.18(0.1)&  2.81(0.1)&  14.1(1.7)&  3.73(0.18)      & 17.03(2.05)&    164(3.1)&   66.0(3.0)\\
184915$^{t}$&B0.5III& 0.19  &0.5(0.3)&  1.0(0.2)&               &   2.0(0.5)&       &   5.5(0.4)&   0.39(0.14)        & 6.64(0.48)& 153(2.8)&   25.0(0.7)\\
190603$^{t}$&B1.5Iae& 0.71  &        &   1.0(0.2)&       &       &       &   11.2(0.4)&  0.22(0.04):                   & 13.53(0.48)&    357(7.1)&   86.7(3.0)\\
203064$^{t}$&O8V    & 0.25  &        &   1.15(0.2)&      &   2.9(0.4)&   1.8(0.1)&   9.2(0.3)&   0.25(0.04):           & 11.11(0.36)&    170(3.4)&   bl\\
203938$^{t}$&B0.5IV & 0.70  &3.8(0.2)&  14.6(0.5)&      &   9.2(1.5)&       &   28.6(0.1)&  5.58(0.18)${^{a}}$                &36.44(2.48):  &  320(6.4)&  117(3.5)\\
204827$^{b}$&B0V    & 1.06  &30.5(1.0)& 64.0(2.5)&  17.7(0.9)&  19.6(0.6)&  13.4(0.4)&  60.7(1.8)&  34.00(0.88)${^{a}}$&   73.30(2.82)& 232(4.6)&  165(5.0)\\
206165$^{t}$&B2Ib   & 0.46  &2.4(0.2)&  6.9(0.6)&   1.1(0.2)&   5.3(0.2)&   3.3(0.2)&   20.2(1.0)&  2.31(0.13)        & 24.39(1.21)&    200(4.1)&  80.4(2.3)\\
206267$^{t}$&O6     & 0.49  &7.8(0.3)&  17.2(1.2)&  4.0(0.2)  &   6.1(0.8)&   3.5(0.3)&   22.5(0.4)&  8.02(0.36)${^{a}}$        & 27.17(0.48)&    217(4.5)&   88.8(3.0)\\
207198$^{t}$&O9II   & 0.55  &2.8(0.3)&  15.3(1.3)&  1.5(0.2)&   11.7(0.3)& 6.9(0.2) &   29.2(0.4)&  5.54(0.39)${^{a}}$        & 35.26(0.46)&    237(4.8)&   133(3.9)\\
207538$^{b}$&B0V    & 0.59  &3.9(0.3)&  11.5(0.6)&  2.0(0.4)  &   8.5(0.6)&   6.9(0.8)&   29.9(1.3)&  3.82(0.23)        & 44.41(3.50)${^{b}}$& 240(5.3)&   164(4.7)\\
208501$^{t}$&B8Ib   & 0.77  &14.2(0.6)& 29.4(2.3)&  8.2(0.6)&   10.9(0.3)&  8.2(0.8)&   37.5(1.9)&  12.67(0.70)${^{a}}$& 54.64(3.55)${^{b}}$& 222(4.6)&   99.2(3.7)   \\
209481$^{t}$&O9V    & 0.35  &        &   3.5(0.7)&       &            &      &   7.5(1.0)&   0.77(0.15):               & 9.06(1.21)& 172(3.0)&   52.0(2.9)\\
210839$^{t}$&O6e    & 0.56  &2.2(0.2)&  8.8(0.4)&       &   7.2(0.3)&   4.6(0.4)&   21.6(0.4)&  2.66(0.15)            & 33.19(0.48)${^{b}}$& 249(5.1)&   bl\\
213087$^{t}$&B0.5Ibe& 0.56  &2.0(0.3)&  4.1(0.5)&   1.0(0.2)  &   5.4(0.6)&   4.5(0.5)&   23.5(1.0)&  1.56(0.21)        & 28.63(1.21)${^{b}}$& 284(5.7)&   72.5(2.1)\\
326331$^{f}$&B          & 0.30  &1.3(0.2)&  2.7(0.3)&       &   2.1(0.1)&   1.2(0.2)&   13.7(0.3)&  1.02(0.13)        & 16.54(0.35)& 222(3.5)&   bl  \\
BD-134927$^{f}$ &O7II   & 1.16  &10.5(0.5)& 19.8(0.8)&  4.7(0.2)&       &       &   44.5(2.0)&  10.13(0.34)${^{a}}$            & 53.74(2.42)&    499(8.9)&   208(7.0)\\
BD-134930$^{f}$ &O9.5V  & 0.53  &   &   7.5(0.3)&       &  10.0(1.0)    & 7.0(1.0)      &   36.9(1.7)&  1.65(0.07):    & 48.27(2.05)${^{b}}$& 412(7.2)&   156(7.0)\\
CPD-417733$^{f}$&O9III  & 0.49  &0.5(0.1)&  1.2(0.1)&       &   2.8(0.2)&   1.2(0.2)    &11.0(0.6)& 0.43(0.06)        & 13.28(0.72)&    217(3.9)&   bl\\
CPD-417735$^{f}$&O9V    & 0.43  &   &   1.2(0.2)&       &       &       &   10.9(0.6)&  0.26(0.04):                    & 13.16(0.72)&    214(3.8)&   62.8(1.8)\\
\hline
\end{tabular}
\end{table}