\begin{table}%t2
\caption{\label{sample_cat}Individual photometric measurements for a sample of stars in the FoV of G78. All photometric measurements for the FoVs of the three clusters are  available in electronic form at the CDS.}
\small
%\centering
\par
\begin{tabular}{l c c c c c c c c c c c }
\hline\hline
ID  & $X$ & $Y$ & {\it F606W} & {\it F606W} & {\it F606W} & {\it F606W} & {\it F814W} & {\it F814W} & {\it F814W} chi & {\it F814W} & selection   \\
    & (px) & (px) &~mag & error & chi$^{2}$ & sharpness &~mag & error & chi$^{2}$ & sharpness & FLAG   \\
(1) & (2)  & (3)  & (4) & (5)   & (6)       & (7)       & (8) & (9)   & (10)      & (11)      & (12)   \\
\hline
   500. &   534.66  &   87.15  &  19.3920 & 0.05770 & 0.92800 & 0.16100 &   19.0470 & 0.05580 & 1.12000 & 0.14300 &  0 \\
   505. &   287.55 &    87.88 &   19.4300 & 0.05890 & 0.92100 & 0.04500  &  20.0100 & 0.08720 & 0.75200 & --0.11500 &  1 \\
   533. &   280.98 &    90.67  &  18.6160 & 0.02680 & 0.71900 & 0.06200  &  18.4820&  0.03030&  0.88300&  0.11800  & 0 \\
 1410. &   286.32 &   185.18 &   19.8010&  0.04260 & 0.43300 & 0.02900 &   20.1830&  0.08080 & 0.60800 &--0.08700  & 1 \\
  1418. &   638.02 &   185.86 &   19.1530 & 0.04340 & 0.81300 & 0.09000  &  18.9620 & 0.03350  &0.64600&  0.17600 &  0 \\
  1434. &   800.98 &   187.72 &   19.3000 & 0.05000&  0.83900&  0.10700  &  18.9020 & 0.03700 & 0.76400 & 0.17400 &  1 \\
  1449. &   797.39 &   189.19 &   20.7160&  0.15410&  0.83300&  0.59500  &  20.5640&  0.10430 & 0.53400 &--0.15900  & 1 \\
\hline
\end{tabular}
\end{table}