\begin{table}%T2
\caption{\label{tab1}Absorption features selected to calculate radial velocities from wavelength shifts.}
\small%\centering
\par
\begin{tabular}{cccc} 
\hline\hline\noalign{\smallskip}
Wavelength (\AA)	& Element & Wavelength (\AA)	& Element\\
\hline
6419.95 & \ion{Fe}{i}& 6705.10 &\ion{Fe}{i}\\
6421.35 &\ion{Fe}{i}& 6710.32 &\ion{Fe}{i}\\
6430.85 &\ion{Fe}{i}& 6717.69 &\ion{Ca}{i}\\
6439.07 &\ion{Ca}{i}& 6726.67 &\ion{Fe}{i}\\
6449.81 &\ion{Ca}{i} &6743.12 &\ion{Ti}{i}\\
6450.23 &\ion{Co}{i} &6750.15 &\ion{Fe}{i}\\
6455.60 &\ion{Ca}{i} &6767.77 &\ion{Ni}{i}\\
6462.57 &\ion{Ca}{i} &6783.70 &\ion{Fe}{i}\\
6469.19 &\ion{Fe}{i}& 6786.86 &\ion{Fe}{i}\\
6471.66 &\ion{Ca}{i}& 6806.84 &\ion{Fe}{i}\\
6475.62 &\ion{Fe}{i}& 6810.26 &\ion{Fe}{i}\\
6481.87 &\ion{Fe}{i} &6814.95 &\ion{Co}{i}\\
6482.80& \ion{Ni}{i}& 6820.37 &\ion{Fe}{i}\\
6493.78 &\ion{Ca}{i} &6828.59 &\ion{Fe}{i}\\
6494.98 &\ion{Fe}{i}& 6839.83 &\ion{Fe}{i}\\
6495.74 &\ion{Fe}{i} &6841.34 &\ion{Fe}{i}\\
6496.47 &\ion{Fe}{i} &6842.04 &\ion{Ni}{i}\\
6496.90 &\ion{Ba}{ii}& 6842.69 &\ion{Fe}{i}\\
6569.22 &\ion{Fe}{i} &6843.66 &\ion{Fe}{i}\\
6572.78 &\ion{Ca}{i} &7090.38 &\ion{Fe}{i}\\
6574.23 &\ion{Fe}{i} &7095.43 &\ion{Fe}{i}\\
6575.02 &\ion{Fe}{i} &7110.90& \ion{Ni}{i}\\
6581.21 &\ion{Fe}{i} &7112.18 &\ion{Fe}{i}\\
6586.31 &\ion{Ni}{i}& 7122.20& \ion{Ni}{i}\\
6592.91& \ion{Fe}{i} &7130.92 &\ion{Fe}{i}\\
6593.87& \ion{Fe}{i} &7142.52& \ion{Fe}{i}\\
6598.60& \ion{Ni}{i} &7145.32 &\ion{Fe}{i}\\
6609.11& \ion{Fe}{i} &7148.15 &\ion{Ca}{i}\\
6703.57& \ion{Fe}{i} &7151.49& \ion{Fe}{i}\\\hline
\end{tabular}
\end{table}