\begin{table}%t3
    \caption{Sources detected using the detection algorithm
    \emph{emldetect}. The parameters given here are for the energy
    range between 0.5 and 10~keV. Column~2: name recommended by the
    \XMM\ SOC and the IAU for source detections. Columns~3 and~4:
    J2000.0~coordinates. Units of right ascension are hours, minutes,
    and seconds, and units of declination are degrees, arc-minutes,
    and arc-seconds. Column~5: error on the source position in
    arc-seconds. Column~6: number of counts in EMOS1 and EMOS2 within a
    10\arcsec~integration region using events above 0.5~keV. Column~7:
    statistical significance of the detection derived with
    {\emph{emldetect}}. Column~8: source flux above 0.5~keV in
    $10^{-14}~\UNITS{erg~cm^{-2}~s^{-1}}$.}
    \label{tab:xray_ptsrc}
    %\centering
\small
    \begin{tabular}{c | c | c c c | c c c}
      \hline \hline
%&&&&&&& \\[-8pt]
      Id & XMMU~J &  RA$_{2000}$ & Dec$_{2000}$ & 2D Error & Counts
      & Significance & Flux $\times$ $10^{-14}$\\
      (1) & (2) & (3) & (4) & (5) & (6) & (7) & (8)\\ 
      \hline
      1 & 174434.5--301522 & \HMS{17}{44}{34.47} & \DMS{-30}{15}{21.9} & 0.6 & 280 & 14.3 & $10.4 \pm 0.7$\\
      2 & 174441.3--301648 & \HMS{17}{44}{41.27} & \DMS{-30}{16}{47.8} & 0.6 & 209 & 12.0 & $8.4 \pm 0.7$ \\
      3 & 174437.6--301812 & \HMS{17}{44}{37.55} & \DMS{-30}{18}{12.3} & 1.3 & 51  & 5.2 & $2.1 \pm 0.4$\\
      4 & 174425.3--302236 & \HMS{17}{44}{25.30} & \DMS{-30}{22}{36.1} & 1.3 & 70 & 7.0 & $3.2 \pm 0.4$\\
      5 & 174458.6--301743 & \HMS{17}{44}{58.59} & \DMS{-30}{17}{43.2} & 0.9 & 95 & 7.5 & $5.2 \pm 0.7$\\
      6 & 174351.0--301709 & \HMS{17}{43}{51.03} & \DMS{-30}{17}{09.0} & 1.0 & 76 & 6.9 & $4.4 \pm 0.6$\\ \hline
    \end{tabular}
\end{table}