\begin{table}%t1
\caption{Parameters of the CXB dipole component in the energy band
3$-$8~keV determined from RXTE/PCA~data.}\label{dipoles}
%\centering
\small
\begin{tabular}{lccc}
\hline \hline
&&& \\[-8pt]
Map&Amplitude ($\Delta$, $10^{-3}$)& $l(^\circ)$ & $b(^\circ)$\\
\hline
All sky&$10.4\pm0.5$&$294\pm20$&$8\pm6$\\
CG corrected&$8.1\pm0.9$&$333\pm21$&$2\pm7$\\
\hline
\end{tabular}
\end{table}