\begin{table}%t1
%\centering
\par
\caption{Parameters of the CoRoT-Exo-2 system. One-sigma errors are given, when relevant, in the last column. a) From \cite{bou08}. b) Zero albedo equilibrium temperature.}  
\begin{tabular}{lrr}
\hline\hline
Star CorotID &\multicolumn{2}{c}{0101206560}\\
RA (J2000) &\multicolumn{2}{c} {19$^{\rm h}$27$^{\rm m}$06.5$^{\rm s}$}\\
Dec (J2000) &\multicolumn{2}{c} {1$\degr$23$\arcmin$01.5$\arcsec$}\\
$V_{\rm mag}$& \multicolumn{2}{c}{12.57} \\
\hline
\multicolumn{3}{c}{\emph{Obtained from the CoRoT photometry}} \\
& Value& Error\\
$P$ [d]&  1.7429964&0.0000017\\
$T_{\rm c}$ [BJD] &  2~454~237.53562& 0.00014\\
\multicolumn{2}{c}{\emph{Fitted}}&\\
$\theta_{1}$ & 0.02715&0.00008\\
$k=R_{\rm p}/R_{\rm s}$ &  0.1667&0.0006\\
$i$ [deg]& 87.84&0.10\\
$u_+$ & 0.471&0.019\\
$u_-$ & 0.34&0.04\\
\multicolumn{2}{c}{\emph{Deduced}}& \\
$u_a$ & 0.41&0.03\\
$u_b$ & 0.06&0.03\\
$a/R_{\rm s}$ & 6.70&0.03 \\
$a/R_{\rm p}$ & 40.3&0.3 \\
$M_{\rm s}^{(1/3)}/R_{\rm s}$  & 1.099&0.005 \\
\hline
\multicolumn{3}{c}{\emph{Photometry, spectroscopy and radial velocity combined}}\\
$V_0$ [\kms] & 23.245&0.010\\
$K$ [\kms] &  0.563&0.014\\
$e$ &  0 &(fixed)\\
$M_{\rm s}$ [\Msun] & 0.97&0.06\\
$R_{\rm s}$ [\Rsun] & 0.902&0.018\\
$v\sin i$ [km~s$^{-1}$]$^a$ & 11.85& 0.50\\
$T_{\rm eff}$ [K]$^a$ & 5625 & 120 \\
$M_{\rm p}$ [\Mjup]  & 3.31&0.16\\
$R_{\rm p}$ [\Rjup] & 1.465&0.029\\
$\rho_{\rm p}$ [g/cm$^3$] & 1.31&0.04\\
$T_{\rm eq}$ [K] $^b$& 1537 & 35\\
\hline
\label{tab:parpl}
\end{tabular}
\end{table}