\begin{table}%tA.7
\caption{Measured line fluxes in 10$^{-4}$ photons s$^{-1}$ cm$^{-2}$ of $\sigma$~Gem.}\label{tab:Sig_Gem_lf} 
%\centering
\small
\begin{tabular}{lc|cccc}
\hline \hline
    &      &\multicolumn{2}{|c}{Quiescence} & \multicolumn{2}{c}{Flare} \\
Ion & Wave [$\AA$]& Flux   & Err & Flux & Err \\
\hline
Fe XVII	&15.01	&4.15	&0.11	&6.02	&0.17\\
Fe XVIII	&14.21	&2.81	&0.08	&3.94	&0.11\\
Fe IX	&13.51	&2.15	&0.22	&4.27	&0.21\\
Fe X	&12.84	&2.85	&0.08	&4.41	&0.20\\
Fe XI	&12.28	&2.65	&0.07	&3.51	&0.26\\
Fe XII	&11.77	&1.80	&0.04	&3.79	&0.25\\
Fe XIII	&11.00	&1.46	&0.03	&2.30	&0.30\\
Fe XIV	&10.64	&1.86	&0.04	&7.25	&0.28\\
Fe XV	&1.85	&0.41	&0.04	&2.38	&0.03\\
Fe XVI	&1.78	&0.03	&0.03	&0.67	&0.04\\
C VI	&33.73	&10.33	&16.92	&5.25	&0.23\\
N VI	&28.78	&0.88	&1.15	&0.75	&0.12\\
N VII	&24.78	&5.71	&0.45	&6.86	&0.21\\
O VII	&21.60	&2.26	&0.24	&1.57	&0.18\\
O VIII	&18.97	&19.31	&0.50	&22.00	&0.29\\
Ne IX	&13.45	&3.84	&0.09	&2.84	&0.28\\
Ne X	&12.13	&15.88	&0.16	&22.78	&0.43\\
Mg XI	&9.17	&1.02	&0.03	&1.92	&0.15\\
Mg XII	&8.42	&1.98	&0.04	&5.31	&0.26\\
Al XII	&7.76	&0.11	&0.02	&1.25	&0.27\\
Al XIII	&7.17	&0.21	&0.02	&2.55	&0.26\\
Si XIII	&6.65	&1.11	&0.03	&2.43	&0.12\\
Si XIV	&6.18	&1.53	&0.03	&4.28	&0.10\\
S XV	&5.04	&0.62	&0.04	&1.80	&0.07\\
S XVI	&4.73	&0.52	&0.04	&2.28	&0.09\\
Ar XVII	&3.95	&0.41	&0.03	&0.46	&0.05\\
Ar XVIII	&3.73	&0.29	&0.03	&0.72	&0.07\\
Ca XIX	&3.18	&0.18	&0.02	&0.46	&0.04\\
Ca XX	&3.02	&0.03	&0.02	&0.14	&0.05\\
Ni XIX	&12.43	&0.43	&0.04	&0.59	&0.13\\
\hline 
\end{tabular}
\end{table}