\begin{table}%tA.5
\caption{Measured line fluxes in 10$^{-4}$ photons s$^{-1}$ cm$^{-2}$ of HR1099.}\label{tab:HR1099_lf} 
%\centering
\small
\begin{tabular}{lc|cccc}
\hline \hline
    &      &\multicolumn{2}{|c}{Quiescence} & \multicolumn{2}{c}{Flare} \\
Ion & Wave [$\AA$]& Flux   & Err & Flux & Err  \\
\hline
Fe XVII	&15.01	&5.13	&0.22	&5.35	&0.26\\
Fe XVIII	&14.21	&2.71	&0.15	&2.82	&0.15\\
Fe IX	&13.51	&2.45	&0.30	&2.14	&0.30\\
Fe X	&12.84	&2.23	&0.26	&2.26	&0.25\\
Fe XI	&12.28	&1.66	&0.34	&1.23	&0.35\\
Fe XII	&11.77	&1.11	&0.30	&1.40	&0.29\\
Fe XIII	&11.00	&0.62	&0.35	&0.56	&0.34\\
Fe XIV	&10.64	&0.43	&0.29	&0.80	&0.27\\
Fe XV	&1.85	&0.05	&0.02	&0.13	&0.02\\
Fe XVI	&1.78	&0.00	&0.03	&0.00	&0.02\\
C VI	&33.73	&4.57	&0.41	&5.46	&0.42\\
N VI	&28.78	&0.28	&0.17	&0.11	&0.16\\
N VII	&24.78	&3.33	&0.31	&2.86	&0.28\\
O VII	&21.60	&2.55	&0.31	&2.61	&0.29\\
O VIII	&18.97	&18.65	&0.48	&19.56	&0.46\\
Ne IX	&13.45	&4.03	&0.45	&4.98	&0.45\\
Ne X	&12.13	&16.34	&0.67	&17.07	&0.65\\
Mg XI	&9.17	&0.95	&0.17	&0.82	&0.17\\
Mg XII	&8.42	&1.46	&0.26	&1.86	&0.27\\
Si XIII	&6.65	&0.80	&0.23	&0.97	&0.24\\
Si XIV	&6.18	&0.48	&0.40	&1.02	&0.45\\
S XV	&5.04	&0.43	&0.05	&0.41	&0.05\\
S XVI	&4.73	&0.28	&0.07	&0.25	&0.06\\
Ar XVII	&3.95	&0.05	&0.03	&0.19	&0.04\\
Ar XVIII	&3.73	&0	&0.04	&0	&0.04\\
Ca XIX	&3.18	&0	&0.02	&0.05	&0.02\\
Ca XX	&3.02	&0	&0.03	&0	&0.03\\
Ni XIX	&12.43	&--	&--	&1.02	&0.17\\
\hline 
\end{tabular}
\end{table}