\begin{table}%tA.4
\caption{Measured line fluxes in 10$^{-4}$ photons s$^{-1}$ cm$^{-2}$ of EK~Dra.}\label{tab:EK_Dra_lf} 
%\centering
\small
\begin{tabular}{lc|cccc}
\hline \hline
    &      &\multicolumn{2}{|c}{Quiescence} & \multicolumn{2}{c}{Flare} \\
Ion & Wave [$\AA$]& Flux   & Err & Flux & Err \\
\hline
Fe XVII	&15.01	&1.97	&0.05	&2.05	&0.18\\
Fe XVIII	&14.21	&0.92	&0.03	&1.14	&0.10\\
Fe IX	&13.51	&0.58	&0.06	&0.51	&0.19\\
Fe X	&12.84	&0.44	&0.05	&0.48	&0.15\\
Fe XI	&12.28	&0.49	&0.06	&0.34	&0.21\\
Fe XII	&11.77	&0.29	&0.05	&0.06	&0.21\\
Fe XIII	&11.00	&0.15	&0.06	&0.39	&0.26\\
Fe XIV	&10.64	&0.12	&0.05	&0.17	&0.18\\
Fe XV	&1.85	&0.019	&0.003	&0.07	&0.03\\
Fe XVI	&1.78	&0.01	&0.01	&0.03	&0.04\\
C VI	&33.73	&0.64	&0.07	&0.87	&0.23\\
N VI	&28.78	&0.07	&0.03	&0.06	&0.10\\
N VII	&24.78	&0.36	&0.05	&0.19	&0.14\\
O VII	&21.60	&0.52	&0.06	&0.52	&0.18\\
O VIII	&18.97	&2.34	&0.08	&2.65	&0.24\\
Ne IX	&13.45	&0.57	&0.08	&0.80	&0.27\\
Ne X	&12.13	&1.14	&0.10	&1.80	&0.34\\
Mg XI	&9.17	&0.24	&0.03	&0.34	&0.10\\
Mg XII	&8.42	&0.25	&0.04	&0.31	&0.14\\
Si XIII	&6.65	&0.15	&0.01	&0.31	&0.13\\
Si XIV	&6.18	&0.08	&0.01	&0.22	&0.29\\
S XV	&5.04	&0.04	&0.01	&0.08	&0.03\\
S XVI	&4.73	&0.01	&0.01	&0.02	&0.03\\
Ar XVII	&3.95	&0.007	&0.004	&0.04	&0.02\\
Ar XVIII	&3.73	&0	&0.01	&0.01	&0.03\\
Ca XIX	&3.18	&0.003	&0.003	&0.04	&0.02\\
Ca XX	&3.02	&0	&0.004	&0.03	&0.04\\
Ni XIX	&12.43	&0.13	&6.19	&0.35	&0.11\\
\hline 
\end{tabular}
\end{table}