\begin{table}%tA.3
\caption{Measured line fluxes in 10$^{-4}$ photons s$^{-1}$ cm$^{-2}$ of 47~Cas.}\label{tab:47_Cas_lf} 
%\centering
\small
\begin{tabular}{lc|cccc}
\hline \hline
    &      &\multicolumn{2}{|c}{Quiescence} & \multicolumn{2}{c}{Flare} \\
Ion & Wave [$\AA$]& Flux   & Err & Flux & Err  \\
\hline
Fe XVII	&15.01	&2.36	&0.08	&2.84	&0.28\\
Fe XVIII	&14.21	&1.26	&0.05	&1.54	&0.16\\
Fe IX	&13.51	&1.02	&0.09	&1.65	&0.31\\
Fe X	&12.84	&0.79	&0.08	&0.65	&0.28\\
Fe XI	&12.28	&0.70	&0.10	&0.95	&0.39\\
Fe XII	&11.77	&0.53	&0.09	&1.04	&0.42\\
Fe XIII	&11.00	&0.16	&0.10	&0.23	&0.48\\
Fe XIV	&10.64	&0.27	&0.08	&0.98	&0.36\\
Fe XV	&1.85	&0.016	&0.005	&0.14	&0.05\\
Fe XVI	&1.78	&0.006	&0.009	&0.016	&0.075\\
C VI	&33.73	&1.24	&0.12	&1.10	&0.40\\
N VI	&28.78	&0.11	&0.05	&0.43	&0.21\\
N VII	&24.78	&0.78	&0.09	&1.22	&0.37\\
O VII	&21.60	&0.73	&0.08	&0.81	&0.38\\
O VIII	&18.97	&5.17	&0.14	&5.39	&0.42\\
Ne IX	&13.45	&0.99	&0.13	&0.02	&0.41\\
Ne X	&12.13	&2.70	&0.16	&3.74	&0.57\\
Mg XI	&9.17	&0.43	&0.05	&0.89	&0.20\\
Mg XII	&8.42	&0.61	&0.08	&0.75	&0.27\\
Si XIII	&6.65	&0.25	&0.03	&0.43	&0.10\\
Si XIV	&6.18	&0.20	&0.02	&0.23	&0.07\\
S XV	&5.04	&0.10	&0.01	&0.14	&0.05\\
S XVI	&4.73	&0.04	&0.01	&0.09	&0.06\\
Ar XVII	&3.95	&0.02	&0.01	&0	&0.04\\
Ar XVIII	&3.73	&0	&0.01	&0	&0.06\\
Ca XIX	&3.18	&0	&0.01	&0.03	&0.04\\
Ca XX	&3.02	&0	&0.01	&0	&0.06\\
Ni XIX	&12.43	&--	&--	&0.18	&0.18\\
\hline 
\end{tabular}
\end{table}