\begin{table}%tA.2
\caption{Measured line fluxes in 10$^{-4}$ photons s$^{-1}$ cm$^{-2}$ of Algol.}
\label{tab:Algol_lf} 
\small
\begin{tabular}{lc|cccc}
\hline \hline 
    &      &\multicolumn{2}{|c}{Quiescence} & \multicolumn{2}{c}{Flare} \\
Ion & Wave [$\AA$]& Flux   & Err & Flux & Err  \\
\hline 
Fe XVII	&15.01	&4.65	&0.13	&4.09	&0.30\\
Fe XVIII	&14.21	&2.83	&0.09	&2.81	&0.18\\
Fe IX	&13.51	&2.55	&0.18	&2.36	&0.35\\
Fe X	&12.84	&2.61	&0.17	&2.40	&0.33\\
Fe XI	&12.28	&2.31	&0.22	&2.32	&0.43\\
Fe XII	&11.77	&2.15	&0.22	&2.24	&0.41\\
Fe XIII	&11.00	&1.29	&0.26	&0.89	&0.47\\
Fe XIV	&10.64	&1.78	&0.20	&2.15	&0.43\\
Fe XV	&1.85	&0.32	&0.02	&0.90	&0.07\\
Fe XVI	&1.78	&0.00	&0.03	&0.25	&0.09\\
C VI	&33.73	&0.19	&0.15	&0.00	&0.30\\
N VI	&28.78	&0.58	&0.11	&0.67	&0.22\\
N VII	&24.78	&5.03	&0.20	&5.73	&0.41\\
O VII	&21.60	&1.21	&0.15	&1.26	&0.31\\
O VIII	&18.97	&9.63	&0.23	&10.32	&0.45\\
Ne IX	&13.45	&1.36	&0.24	&2.11	&0.47\\
Ne X	&12.13	&8.07	&0.35	&8.56	&0.67\\
Mg XI	&9.17	&0.92	&0.11	&0.96	&0.23\\
Mg XII	&8.42	&1.77	&0.17	&1.86	&0.36\\
Si XIII	&6.65	&1.08	&0.15	&1.03	&0.32\\
Si XIV	&6.18	&1.10	&0.26	&0.41	&0.56\\
S XV	&5.04	&0.55	&0.06	&0.20	&0.14\\
S XVI	&4.73	&0.35	&0.08	&0.48	&0.19\\
Ar XVII	&3.95	&0.24	&0.04	&0.00	&0.10\\
Ar XVIII	&3.73	&0.19	&0.05	&0.18	&0.14\\
Ca XIX	&3.18	&0.07	&0.03	&0.13	&0.08\\
Ca XX	&3.02	&0.01	&0.04	&0.27	&0.11\\
Ni XIX	&12.43	&--	&--	&0.43	&0.22\\
\hline 
\end{tabular} 
\end{table}