\begin{table}%tA.1
\par
\caption{Measured line fluxes in 10$^{-4}$ photons s$^{-1}$ cm$^{-2}$ of CC~Eri.} \label{tab:CC_Eri_lf}
%\centering
\small
\begin{tabular}{lc|cccc}
\hline \hline 
    &      &\multicolumn{2}{|c}{Quiescence} & \multicolumn{2}{c}{Flare} \\
Ion & Wave [$\AA$]& Flux   & Err & Flux & Err  \\
\hline\\[-3mm]
Fe XVII	&15.01	&2.49	&0.09	&3.26	&0.09\\
Fe XVIII	&14.21	&0.86	&0.06	&1.55	&0.05\\
Fe IX	&13.51	&0.57	&0.05	&1.04	&0.10\\
Fe X	&12.84	&0.51	&0.04	&0.84	&0.08\\
Fe XI	&12.28	&0.41	&0.03	&0.75	&0.11\\
Fe XII	&11.77	&0.26	&0.02	&0.44	&0.09\\
Fe XIII	&11.00	&0.23	&0.02	&0.24	&0.10\\
Fe XIV	&10.64	&0.22	&0.02	&0.16	&0.07\\
Fe XV	&1.85	&0.03	&0.03	&0.03	&0.01\\
Fe XVI	&1.78	&0.01	&0.05	&0.00	&0.01\\
C VI	&33.73	&--	&--	&5.92	&0.20\\
N VI	&28.78	&--	&--	&0.57	&0.06\\
N VII	&24.78	&--	&--	&3.63	&0.14\\
O VII	&21.60	&3.66	&0.41	&4.21	&0.14\\
O VIII	&18.97	&14.75	&0.51	&14.75	&0.20\\
Ne IX	&13.45	&2.96	&0.08	&3.70	&0.16\\
Ne X	&12.13	&4.96	&0.10	&6.59	&0.21\\
Mg XI	&9.17	&0.27	&0.01	&0.44	&0.05\\
Mg XII	&8.42	&0.28	&0.02	&0.59	&0.07\\
Si XIII	&6.65	&0.37	&0.02	&0.59	&0.04\\
Si XIV	&6.18	&0.28	&0.02	&0.48	&0.03\\
S XV	&5.04	&0.18	&0.02	&0.24	&0.02\\
S XVI	&4.73	&0.10	&0.02	&0.12	&0.02\\
Ar XVII	&3.95	&0.04	&0.01	&0.02	&0.01\\
Ar XVIII	&3.73	&0.02	&0.01	&0	&0.01\\
Ca XIX	&3.18	&0	&0.01	&0	&0.01\\
Ca XX	&3.02	&0.01	&0.01	&0	&0.01\\
Ni XIX	&12.43	&0.16	&0.02	&0.25	&0.05\\
\hline 
\end{tabular}
\end{table}