\begin{table}%t2
\caption{Abundances measured relative to Fe during flare, quiescence$^{1}$, and the flare to quiescence ratio. }\label{tab:abundances}
\small%\begin{center}
 {
\begin{tabular}{c | c c c c c c | c c c c c c}				\hline \hline						 & \multicolumn{6}{c}{{CC Eri}} & \multicolumn{6}{|c}{{$\sigma$~Gem}} \\		 & \multicolumn{2}{c}{Quies.} & \multicolumn{2}{c}{Flare} & \multicolumn{2}{c}{Flare/Quies.}		&\multicolumn{2}{|c}{Quies.} & \multicolumn{2}{c}{Flare} & \multicolumn{2}{c}{Flare/Quies.} \\		El. & X/Fe &Error & X/Fe & Error & Ratio & Error 
	 & X/Fe &Error & X/Fe & Error & Ratio & Error \\
\hline						C	& --	& --	&47.9	&2.3	& --	& --	& --	& --	&32.1	&2.6	& --	& -- \\
N	& --	& --	&16.6	&0.8	& --	& --	& --	& --	&21.3	&1.4	& --	& --\\
O	&72.3	&3.3	&48.6	&1.4	&0.67	&0.04	&44.6	&2.7	&27.5	&1.5	&0.62	&0.05\\
Ne	&21.1	&0.5	&19.5	&0.6	&0.92	&0.04	&20.1	&0.9	&14.0	&0.8	&0.70	&0.05\\
Mg	&1.49	&0.07	&1.77	&0.14	&1.2	&0.1	&1.89	&0.08	&2.2	&0.1	&1.17	&0.09\\
Si	&2.17	&0.09	&2.2	&0.1	&1.01	&0.07	&1.39	&0.06	&1.53	&0.08	&1.11	&0.08\\
S	&1.26	&0.15	&1.03	&0.08	&0.8	&0.1	&0.63	&0.04	&0.81	&0.05	&1.3	&0.1\\
Ar	&0.4	&0.1	&0.11	&0.05	&0.27	&0.16	&0.50	&0.04	&0.23	&0.02	&0.46	&0.05\\
Ca	&0.08	&0.1	&0.00	&0.06	& --	& --	&0.19	&0.03	&0.20	&0.02	&1.0	&0.2\\
Ni	&0.07	&0.01	&0.08	&0.02	&1.0	&0.3	&0.07	&0.01	&0.07	&0.01	&0.9	&0.2\\
\hline						 & \multicolumn{6}{c}{{Algol}} & \multicolumn{6}{|c}{{HR1099}} \\			C	&1.4	&1.0	& --	& --	&--	&--	&24.3	&2.5	&31.7	&2.4	&1.3	&0.2\\
N	&20	&1	&24	&3	&1.2	&0.2	&6.3	&0.8	&7.9	&0.6	&1.3	&0.2\\
O	&21.6	&0.7	&22.5	&1.6	&1.04	&0.08	&26.7	&2.2	&33	&1	&1.2	&0.1\\
Ne	&9.7	&0.5	&10.6	&0.9	&1.1	&0.1	&7.0	&0.7	&9.0	&0.5	&1.3	&0.1\\
Mg	&1.7	&0.1	&1.7	&0.3	&1.0	&0.2	&2.4	&0.4	&1.8	&0.2	&0.8	&0.1\\
Si	&1.26	&0.15	&0.9	&0.3	&0.7	&0.3	&1.7	&0.3	&1.52	&0.08	&0.9	&0.2\\
S	&0.57	&0.06	&0.32	&0.12	&0.6	&0.2	&0.1	&0.3	&0.55	&0.05	&5	&12\\
Ar	&0.33	&0.06	&--	&--	&--	&--	&--	&--	&--	&--	&--	&--\\
Ca	&0.10	&0.04	&0.18	&0.06	&2	&1	&--	&--	&--	&--	&--	&--\\
Ni	&--	&--	&0.07	&0.04	&--	&--	&--	&--	&--	&--	&--	&--\\
\hline						 & \multicolumn{6}{c}{{47 Cas}} & \multicolumn{6}{|c}{{EK Dra}} \\			C	&19	&3	&12.0	&5.6	&0.6	&0.3	&9.5	&1.4	&13	&6	&1.3	&0.7\\
N	&7.0	&0.8	&9.4	&2.9	&1.3	&0.4	&3.5	&0.5	&1.9	&1.4	&0.6	&0.4\\
O	&29	&1	&27	&4	&0.9	&0.1	&15.8	&0.9	&18.5	&2.4	&1.2	&0.2\\
Ne	&9.7	&0.6	&8.7	&1.8	&0.9	&0.2	&5.8	&0.4	&8.6	&1.5	&1.5	&0.3\\
Mg	&2.1	&0.2	&2.7	&0.6	&1.3	&0.3	&1.6	&0.2	&2.0	&0.5	&1.3	&0.3\\
Si	&1.00	&0.09	&1.0	&0.3	&1.0	&0.3	&1.0	&0.1	&2.1	&0.9	&2.1	&0.9\\
S	&0.43	&0.06	&0.5	&0.2	&1.1	&0.5	&0.30	&0.06	&0.6	&0.3	&2.1	&1.2\\
Ar	&0.13	&0.05	&0.00	&0.16	&--	&--	&--	&--	&--	&--	&--	&--\\
Ca	& --	& --	&0.1	&0.2	& --	& --	&--	&--	&0.8	&0.5	&--	&--\\
Ni	&0.3	&4.7	&0.05	&0.05	&0.2	&3	& --	&--	&0.16	&0.05	&--	&--\\
\hline						 & \multicolumn{6}{c}{{$\xi$ Boo}} & \multicolumn{6}{|c}{{Proxima Cen}} \\		C	&7.6	&0.6	&6.6	&0.8	&0.9	&0.1	&24	&3	&32	&2	&1.3	&0.2\\
N	&1.4	&0.2	&1.3	&0.2	&0.9	&0.2	&6.3	&0.8	&7.9	&0.6	&1.3	&0.2\\
O	&11.5	&0.5	&11.3	&0.7	&0.98	&0.07	&27	&2	&33	&1	&1.2	&0.1\\
Ne	&3.6	&0.2	&3.5	&0.3	&1.0	&0.1	&7.0	&0.7	&9.0	&0.5	&1.3	&0.1\\
Mg	&1.6	&0.1	&1.2	&0.1	&0.74	&0.09	&2.4	&0.4	&1.8	&0.1	&0.8	&0.1\\
Si	&1.2	&0.2	&1.0	&0.2	&0.8	&0.2	&1.7	&0.3	&1.52	&0.08	&0.90	&0.15\\
S	&0.41	&0.07	&0.7	&0.1	&1.6	&0.4	&0.1	&0.3	&0.55	&0.05	&5	&12\\
Ar	&0.18	&0.06	&0.11	&0.08	&0.6	&0.5	&--	&--	&--	&--	&--	&--\\
Ca	&0.25	&0.09	&--	&--	&--	&--	&--	&--	&--	&--	&--	&--\\
Ni	&--	&--	&--	&--	&--	&--	&--	&--	&--	&--	&--	&--\\
\hline
\end{tabular}}
\parbox{13cm}{
$^{1}$ Quiescence abundances for CC Eri and $\sigma$~Gem are from \citet{Nordon2007}. }
%\end{center}
\end{table}