\begin{table}%T1
\caption{The input parameters and observed properties of the models.}
\label{tab_results}
\small%\centerline
{
\begin{tabular}{c c c c c c c c c c c c}  
\hline\hline          
    & \multicolumn{5}{c}{Input parameters} & & \multicolumn{4}{c}{Observed properties} \\
$\#$  & $\alpha_{\rm init}$ & $\xi$ & $\log M_{\rm low}$ [$M_\odot$] & $ff$ [$\%$]& $\rho_{\rm 2D}$ [$\%$]& $\alpha_{\rm true}$ & $\alpha_{\rm obs}$ & $\frac{N_{\rm obs}}{N_{\rm tot}}$ [$\%$]& $\frac{M_{\rm obs}}{M_{\rm tot}}$ [$\%$] & $A_{H-K}$$^a$ & $A_{J-H}$ \\
\noalign{\smallskip}\hline\noalign{\smallskip}
1$^b$  & 2.5 & 0.10 & 4.0 & 23  & 11       & --  & --  & $<$$1$ & --      
& --  $\pm$ --   & --  $\pm$ --   \\  
   2  & 2.5 & 0.27 & 4.0 & 12  & 11       & 2.6 & 2.6 & 2.7 & 7.3 
& 6.7 $\pm$ 0.75 & 9.0 $\pm$ 0.33 \\  
   3  & 2.5 & 0.50 & 4.0 & 7.2 & 11       & 2.6 & 2.2 & 6.2 & 11  
& 6.3 $\pm$ 0.78 & 5.8 $\pm$ 0.30 \\  
   4  & 2.5 & 0.75 & 4.0 & 4.9 & 11       & 2.4 & 2.2 & 8.6 & 22  
& 3.7 $\pm$ 0.49 & 5.2 $\pm$ 0.30 \\  
   5  & 2.0 & 0.10 & 4.0 & 13  & 14       & 1.9 & 2.7 & 7.1 & 5.8 
 & 10  $\pm$ 0.40 & 9.0 $\pm$ 0.26 \\  
   6  & 2.0 & 0.27 & 4.0 & 12  & 13       & 2.0 & 2.7 & 7.9 & 7.2 
 & 7.1 $\pm$ 0.26 & 7.4 $\pm$ 0.24 \\  
   7  & 2.0 & 0.50 & 4.0 & 7.2 & 14       & 1.9 & 2.0 & 11  & 8.8 
& 5.7 $\pm$ 0.21 & 5.2 $\pm$ 0.21 \\  
   8  & 2.0 & 0.75 & 4.0 & 5.4 & 14       & 2.0 & 2.0 & 14  & 9.8 
& 3.7 $\pm$ 0.13 & 4.5 $\pm$ 0.13 \\  
   9  & 1.5 & 0.10 & 4.0 & 28  & 17       & 1.5 & 2.8 & 33  & 7.0 
& 8.4 $\pm$ 0.23 & 8.3 $\pm$ 0.26 \\  
   10 & 1.5 & 0.27 & 4.0 & 14  & 18       & 1.5 & 2.4 & 34  & 6.3 
& 7.6 $\pm$ 0.25 & 7.4 $\pm$ 0.11 \\  % 4.3
   11 & 1.5 & 0.50 & 4.0 & 9.0 & 18       & 1.6 & 2.0 & 35  & 8.3 
& 5.1 $\pm$ 0.13 & 5.4 $\pm$ 0.13 \\  % 2.3 
   12 & 1.5 & 0.75 & 4.0 & 6.2 & 17       & 1.5 & 2.1 & 33  & 11  
& 4.1 $\pm$ 0.11 & 4.5 $\pm$ 0.08 \\  % 
\hline
   13 & 2.5 & 0.10 & 4.5 & 28  & 24       & 2.6 & 3.1 & 8.0 & 7.0 
& 9.5 $\pm$ 0.85 & 10  $\pm$ 0.41 \\
   14 & 2.5 & 0.27 & 4.5 & 18  & 24       & 2.6 & 2.7 & 14  & 8.4 
& 7.0 $\pm$ 0.68 & 7.7 $\pm$ 0.65 \\
   15 & 2.5 & 0.50 & 4.5 & 12  & 24       & 2.7 & 2.8 & 24  & 10  
& 5.1 $\pm$ 0.43 & 6.2 $\pm$ 0.34 \\
   26 & 2.5 & 0.75 & 4.5 & 8   & 24       & 2.7 & 2.4 & 31  & 14  
& 3.6 $\pm$ 0.34 & 4.6 $\pm$ 0.33 \\
17 & 2.0 & 0.10 & 4.5 & 55  & 31       & 2.1 & 2.4 & 19  & 8.2 
& 9.2 $\pm$ 0.35 & 9.5 $\pm$ 0.30 \\ % 4.1
   18 & 2.0 & 0.27 & 4.5 & 38  & 31       & 2.0 & 2.2 & 21  & 9.2 
& 6.8 $\pm$ 0.23 & 7.2 $\pm$ 0.20 \\ % 4.6
   19 & 2.0 & 0.50 & 4.5 & 27  & 31       & 2.0 & 2.0 & 27  & 13  
& 4.9 $\pm$ 0.20 & 5.2 $\pm$ 0.20 \\ % 6.4
   20 & 2.0 & 0.75 & 4.5 & 20  & 31       & 1.9 & 2.0 & 34  & 13  
& 4.1 $\pm$ 0.13 & 4.0 $\pm$ 0.12 \\ % 6.3
   21 & 1.5 & 0.10 & 4.5 & 27  & 17       & 1.5 & 2.4 & 17  & 7.2 
& 9.4 $\pm$ 0.27 & 8.2 $\pm$ 0.19 \\  % unsmoothed, M!
   22 & 1.5 & 0.27 & 4.5 & 14  & 15       & 1.5 & 2.3 & 9.8 & 8.5 
& 6.9 $\pm$ 0.25 & 6.8 $\pm$ 0.20 \\  % unsmoothed, M!
   23 & 1.5 & 0.50 & 4.5 & 10  & 16       & 1.5 & 2.4 & 13  & 8.0 
& 4.6 $\pm$ 0.15 & 4.4 $\pm$ 0.20 \\  % unsmoothed, M!
   24 & 1.5 & 0.75 & 4.5 & 8.0 & 19       & 1.5 & 2.5 & 19  & 9.1 
& 3.9 $\pm$ 0.08 & 3.8 $\pm$ 0.09 \\  % unsmoothed, M!
\hline
   25 & 2.5 & 0.10 & 5.0 & 36  & 32       & 2.7 & 2.7 & 53  & 5.1 
 & 12  $\pm$ 0.57 & 11  $\pm$ 0.19 \\  
   26 & 2.5 & 0.27 & 5.0 & 20  & 32       & 2.5 & 2.6 & 56  & 6.7 
& 8.0 $\pm$ 0.48 & 9.3 $\pm$ 0.22 \\  
   27 & 2.5 & 0.50 & 5.0 & 10  & 32       & 2.5 & 2.8 & 58  & 8.1 
 & 7.1 $\pm$ 0.23 & 6.4 $\pm$ 0.17 \\  
   28 & 2.5 & 0.75 & 5.0 & 7.8 & 32       & 2.5 & 2.6 & 59  & 11  
& 4.3 $\pm$ 0.17 & 4.5 $\pm$ 0.14 \\  
   29 & 2.0 & 0.10 & 5.0 & 37  & 30       & 2.0 & 2.9 & 68  & 7.2 
& 11  $\pm$ 0.35 & 11  $\pm$ 0.28 \\ % 3.0
   30 & 2.0 & 0.27 & 5.0 & 14  & 24       & 2.0 & 2.7 & 91  & 9.0 
& 7.6 $\pm$ 0.37 & 7.5 $\pm$ 0.31 \\ % 3.9 
   31 & 2.0 & 0.50 & 5.0 & 11  & 30       & 2.0 & 2.3 & 83  & 10  
& 5.6 $\pm$ 0.15 & 5.5 $\pm$ 0.23 \\ % 3.1
   32 & 2.0 & 0.75 & 5.0 & 7.0 & 30       & 1.9 & 2.3 & 94  & 14  
& 4.2 $\pm$ 0.11 & 4.3 $\pm$ 0.10 \\ % 3.9
   33 & 1.5 & 0.10 & 5.0 & 28  & 17       & 1.4 & 2.4 & 71  & 7.0 
& 8.2 $\pm$ 0.27 & 8.1 $\pm$ 0.29 \\  %same as 9, clipped, M!
   34 & 1.5 & 0.27 & 5.0 & 14  & 18       & 1.5 & 2.2 & 78  & 7.6 
& 7.8 $\pm$ 0.19 & 7.6 $\pm$ 0.18 \\  %same as 10, clipped, M!
   35 & 1.5 & 0.50 & 5.0 & 9.0 & 18       & 1.6 & 1.9 & 85  & 8.5 
& 5.4 $\pm$ 0.12 & 5.6 $\pm$ 0.16 \\  %same as 11, clipped, M!
   36 & 1.5 & 0.75 & 5.0 & 6.2 & 17       & 1.5 & 2.1 & 78  & 10  
& 4.3 $\pm$ 0.12 & 4.6 $\pm$ 0.09 \\  %same as 12, clipped, M!
\hline                  
\end{tabular}}
\smallskip
$^a$  Slope of the fit to the frequency distribution of color excess pixel values, i.e. $\log y=-Ax+B$.\\
$^b$ With the parameter settings of this run, only a very small fraction of the clouds were detected.  
\end{table}