\begin{table}%t5
\caption{Elliptical fits of modeled SO$_2$ spatial distribution.
G stands for elliptical Gaussian model, D for elliptical disk model.
S and F stand for the \citet{spencer05} and \citet{feaga07} SO$_2$~distribution models.}\label{mapsmodelsfits}
\small%\centerline
 {
\begin{tabular}{llllllll}
\hline \hline
Hemisphere     &  Gas  model &Gas temperature & Fit type     &  RA ($''$) & Dec ($''$) & Resolved  & Total flux \\
               &     &   (K)      &                &           &        & size ($''$)        & (Jy) \\ \hline 
Leading & S & 166 & D &      0.03   & --0.01 & 0.99 & 0.95\\
        &   &     & G &      0.04 & --0.01 & 0.68 & 0.97 \\    
Leading & F x 3 & 175 & D &  0.045 & --0.04 & 1.06 & 0.94 \\
        &       &     & G  & 0.06 & --0.04 & 0.72 & 0.96 \\
Leading &  S*  &  170 & D &  0.058 & 0.00 & 0.92 & 0.98 \\
        &       &     & G &  0.06 & 0.00 &  0.62 & 1.00 \\
Leading & S ** & 180  & D &  0.066 & 0.00 & 0.84 & 0.94 \\
        &  &   & G &  0.066 & 0 & 0.56 & 0.95 \\
Trailing & S x 0.4 & 160 & D & --0.14 & 0.01 & 0.88 & 0.51 \\
         &         &     & G & --0.15 & 0.02 & 0.61 & 0.52 \\
Trailing & F x 1.3 & 155 & D & --0.05 & 0.03 & 1.11 & 0.47 \\
         &         &     & G & --0.08 & 0.03 & 0.76 & 0.48 \\
Trailing & (S x 0.4)** & 180 & D & --0.08 & 0.00 & 0.78 & 0.48 \\
        &               &    & G & --0.09 & 0.00 & 0.52 & 0.49 \\
Trailing & (S x 0.4)*** & 210 & D & --0.06 & 0.00 & 0.70 & 0.45 \\ 
        &               &      & G & --0.06 & 0.00 & 0.46 & 0.46 \\
\hline
\end{tabular}}
\medskip
* Indicates a distribution restricted to SZA~$<$ 70$^{\circ}$. 
** Indicates a distribution restricted to SZA~$<$ 60$^{\circ}$.   
*** Indicates a distribution restricted to SZA~$<$ 50$^{\circ}$.
Ellipse orientation is fixed to the data fit value ($-$16$^{\circ}$ for the leading, $-$6$^{\circ}$ for the trailing). 
\end{table}