\begin{table}%T3
\caption{List of the FPI scans.}
\label{tab:scans}
%\centering
\small
\begin{tabular}{lclccc}
\hline\hline\noalign{\smallskip}
Optical configuration &FPI \# &Date          &$t_{\exp}$ (s)  & Scan width (\AA)& Illuminated diameter (mm)\\
\hline\noalign{\smallskip}
Collimated            &1      &2001 Nov. 29   &0.1                &0.2              &30\\
Collimated            &1      &2002 Mar. 13   &0.1                &0.2              &30\\
Collimated            &1      &2002 Mar. 13   &0.1                &0.2              &30\\
Collimated            &1      &2002 Mar. 19   &1.0                &0.2              &30\\
Collimated            &1      &2002 Mar. 20   &0.9, 0.2        &0.2              &30\\
Collimated            &2      &2002 Apr. 05    &0.1                &0.7              &30\\
Collimated            &2      &2002 Jun. 10    &0.1                &0.7              &30\\
Telecentric            &1      &2001 Dec. 05   &0.6                &0.2              &45\\
Telecentric            &2      &2001 Dec. 05   &0.6                &0.7              &45\\
Classic                  &1       &2001 Dec. 04   &0.6                &0.2              &45\\
Classic                  &2       &2001 Dec. 04   &0.6                &0.7              &45\\
\hline
\end{tabular}
\end{table}