\begin{table}%T3
\par
\caption{continued.}
\small%\centerline
{
\begin{tabular}{llcccccc}\hline\hline
IRAS field         &  IR   & $\Delta\alpha$ & $\Delta\delta$ & $F_{8.3}$ & $F_{12.1}$ & $F_{14.7}$ & $F_{21.4}$ \\ 
                            &         & (s)                        & (\asec)              & \multicolumn{4}{c}{(Jy)} \\  \hline
18144$-$1723 & A & +6 & $-$3 & 1.4 & 3.4 & 5.4 & 18.2 \\
                            & B & $-$178 & $-$12 & 8.2 & 4 & 2.1 & 1.7 \\
                            & C & +155 & +87 & 1.2 & 1.9 6 1 & 0.9 \\
                            & D & $-$63 & $-$159 & 0.8 & 0.5 & 0.4 & 0.4 \\
                            & E & $-$32 & $-$86 & $-$ & $-$ & 0.7 & 1.2 \\
18278$-$1009 & A & +15 & +3 & 5 & 9.7 & 15.6 & 15.5 \\
                            & B & $-$68 & $-$38 & 1.3 & 2.7 & 1.8 & 1.9 \\
                            & C & $-$12 & $-$169 & 2.5 & 3.6 & 3.6 & 2.8 \\
                            & D & +140 & $-$45 & 4.5 & 4.8 & 3.9 & 2.2 \\
18511+0146 & A$^a$ & +2 & +5 & 18.3 & 26.5 & 36.1 & 47.1 \\
19092+0841 & A$^a$ & +15 & +16 & 3 & 3.1 & 1.7 & 4.1\\
                        & C & $-$172 & +64 & 2.7 & 4 & 2.8 & 2.5 \\
                        & D & +224 & $-$108 & 1.7 & 1.5 & 1.1 & 4.4 \\
20062+3550 & A & +17 & +3 & 1 & 1.3 & 2.7 & 17.2 \\
20106+3545 & A & +9 & +4 & 2.6 & 2.5 & 2.5 & 10.4 \\
                        & B & +34 & +65 &  8 & 3.5 & 3.1 & 3.1 \\
21307+5049 & A$^a$ & +3 & +2 & 1 & 1.1 & 2.7 & 6.5 \\
21519+5613 & A & +10 & $-$5 & 0.75 & 1.4 & 2.2 & 10.8 \\
22172+5549 & A & +2 & +18 & 2 & 5.8 & 3.2 & 7 \\
22305+5803 & A & +3 & +5 & 1.2 & 1.1 & 2.4 & 12.1 \\
22506+5944 & A & +2 & +5 & 4.7 & 6.7 & 5.7 & 18.4 \\
23385+6053 & A$^a$ & +25 & +27 & 2.5 & 6.4 & 0.5 & 0.7 \\
                        & B$^a$ & $-$16 & +23 & 0.7 & 1.5 & 0.2 & 0.1 \\
                        & C & $-$87 & +12 & 0.9 & 0.9 & $-$ & 0.8 \\
\hline
\end{tabular}}
\smallskip
 $^a$ Source also observed with ISOCAM in {\it LW2} and {\it LW3} filters (see Table~\ref{camfluxes}).
\label{irfluxes}
\end{table}