\begin{table}%T2
\caption{Sub-mm and mm fluxes.}
\small%\begin{center}
{{{
\begin{tabular}{lcccccc}
\hline\hline
IRAS field         &  MM~  & $\Delta\alpha$ & $\Delta\delta$ & $F_{450}$ & $F_{850}$ & $F_{1200}$ \\                         &           &       (\asec)                 &   (\asec)            & \multicolumn{3}{c}{(Jy)} \\\hline
05137+3919     & 1 & +8    & +7       &  & 1.15 &  \\                        
                            & 2 & $-$7 & $-$22 &  & 0.33 &  \\
05345+3157     & 1 & +69    & +40     &  & 1.95 &  \\
                            & 2 & +74       & +12     &  & 1.00 &  \\
                            & 3 & +37 & $-$11  &  & 0.5   &  \\
05373+2349     & 1 & +7    & +1          &  &  3.27 &  \\
08211$-$4158 & 1 & +7        & $-$11       &  &  & 1.45 \\
08470$-$4243 & 1 & +1 & $-$11 &  &  & 4.2 \\
08477$-$4359 & 1 & +29     & $-$71 &  &  & 1.4 \\
08563$-$4225 & 1 & $-$6     & $-$10 &  &  & 1.6 \\
08589$-$4714 & 1 & $-$3     & $-$17 &  &  & 0.93 \\
09131$-$4723 & 1 & $-$9     &  +5  &  &  & 1.5 \\
                            & 2 & $-$44     & +16 &  &  & 1.1 \\
10019$-$5712 & 1 & +3           & $-$6   &  &  & 1.15 \\
                            & 2 &  $-$23  & +11    &  &  & 0.47 \\
10095$-$5843 & 1 & 0  & $-$10 &  &  & 0.94 \\
10184$-$5748 & 1 & +17      & $-$23 &  &  & 3.2 \\
                            & 2 & +13  & $-$19 & &  & 0.2 \\
10501$-$5556 & 1 & +12      & $-$14  &  &  & 1.9 \\
10555$-$6242 & 1 & $-$8  & $-$5    & & & 1.7 \\
11380$-$6311 & 1 & +24      & $-$3    & & & 1.7 \\
12063$-$6259 & 1 & $-$3  & $-$11  & &  & 3.3 \\
12127$-$6244 & 1 & $-$4  & $-$12  & & & 5.5 \\
                            & 2 & +101       & $-$36  & & & 0.7 \\
14000$-$6104 & 1 & $-$18      & $-$26  &  & & 3.27 \\
                            & 2 & $-$80   & +1        &  & &  1.2 \\
                            & 3 & $-$30  & +191   &  & &  1.25 \\
                            & 4 & $-$11  & +136   &  & &  1.15 \\
                            & 5 & +215       & $-$111 &  & &  0.65 \\
                            & 6 & +275       & $-$60   &  & &  1.9 \\
                            & 7 & $-$216   & +150     &  & &  0.15 \\
                            & 8 & $-$233 & $-$55  &  & &  1.0 \\
14057$-$6032 & 1 & +13      & $-$13  &  & & 0.93 \\
15068$-$5733 & 1 & +12      & $-$13  &  & & 2.35 \\
15454$-$5335 & 1 & +30      & $-$20  &  & & 6.5 \\
15519$-$5430 & 1 & $-$20  & $-$20   & & & 3.9 \\
15557$-$5337 & 1 & +3      & +7         & & & 6.5 \\
                            & 2 & $-$13  &$-$26    & & & 8.7 \\
16148$-$5011 & 1 & +36     & $-$10    & & & 1.7 \\
                            & 2 & +72     & $-$300    & & & 0.6 \\
16232$-$4917 & 1 & $-$2 & $-$1       & & & 0.8 \\
16501$-$4314 & 1 & +16     & $-$8      & & & 0.83 \\
                            & 2 & $-$15 & 0            &  & & 0.76 \\
16535$-$4300 & 1 & +16     & +3          &  & & 0.91 \\
17082$-$4114 & 1 & $-$27  & $-$22   &  & & 2.8 \\
                            & 2 & $-$10  & +30       &  & & 1.6 \\
                            & 3 & $-$61  &+6          &  & & 1.8 \\
17425$-$3017 & 1 & $-$3  & +12       & & & 1.0 \\
18024$-$2119 & 1 & +7           & +15       & 31.2 & 3.9 & \\
18144$-$1723 & 1 & 0  & +1           & 28.3 & 7.6 &  \\
18278$-$1009 & 1 & +10      & +4        & 12.3 & 1.6 & \\
18511+0146 & 1 & 0      & +3        & 53.4 & 3.6 & \\
                        & 2 & 0                & $-$15  & 7.7 & 1.5 & \\
19092+0841 & 1 & +30          & +1        & 44.6 & 5.4 & \\
20062+3550 & 1 & +16          & $-$1          &          & 3.1 & \\
20106+3545 & 1 & +20          & +2        & 5.55 & 0.84 & \\
                        & 2 & +11          & +10      & 6.5    & 0.89 & \\
21307+5049 & 1 & $-$2      & $-$3    &           & 1.5   &  \\
21519+5613 & 1 & +9          & $-$2    &           & 1.2   & \\
22172+5549 & 1 & $-$1      & +14      &           & 1.9   & \\
22305+5803 & 1 & $-$5      & +4        &           &          & 0.44$^a$ \\
22506+5944 & 1 & +1      & $-$10    & 17.5 & 3.5 & \\
                        & 2 & +1      & $-$11  & 12.9 &  $^b$ & \\
                        & 3 & +31          & $-$23  & 4.0   & 0.35 & \\
23385+6053 & 1 & +12         & +10      &          & 1.8 & \\
\hline\\[-3mm]
\end{tabular}}}}
\parbox{7.2cm}{ 
{$^a$ Obtained at IRAM-30~m (${\it HPBW}\sim10$\asec).} \\
{$^b$ Blended with MM1 @850~\um.}}
\label{mmfluxes}
%\end{center}
\end{table}