\begin{table}%t3
\caption{Element abundances of CS 22876-032. The Solar O abundance is 
adopted from the 3D~measurement of atomic lines of \citet{LS07};  the other Solar 
abundances from \citet{gas00}. [X/H] and [X/Fe] are LTE values; [X/Fe] 
refers to \ion{Fe}{i}~for OH and neutral species, to \ion{Fe}{ii}~for 
ionised species. The 3D~abundance corrections $\Delta_{\rm 3D-1D}$ were 
determined with {\scshape turbospectrum} from the $\langle$3D$\rangle$ and 1D~models, except for O and Li, where a full 3D~analysis was performed  
and we give two values: the abundance correction {\tac} (``$\langle$3D$\rangle$'') and ``1D'' = {\ftac} (see text). 
$\sigma$ is the standard deviation of the results from the $n$ lines 
(next column; if $n=1$, the wavelength of the line in~nm is given). 
See text for details on the measurement of Li, O, Sc, and Co.}             
\small%\centering
\par
\begin{tabular}{lrrrrrrrrrrr}     
\hline
\hline       
\noalign{\smallskip}
Species & $\log \epsilon({\rm X})_{\odot}$ & $[{\rm X}/{\rm H}]_{\rm A}$ 
& $[{\rm X}/{\rm Fe}]_{\rm A}$ & $\Delta_{\rm 3D-1D, A}$ & 
$\sigma_{\rm A}$ & $n_{\rm A}$ & $[{\rm X}/{\rm H}]_{\rm B}$ & 
$[{\rm X}/{\rm Fe}]_{\rm B}$
& $\Delta_{\rm 3D-1D,B}$ & $\sigma_{\rm B}$ & $n_{\rm B}$ \\    
\noalign{\smallskip}
\hline
\noalign{\smallskip}
\ion{Li}{i}& -- & 2.22 & -- & $^{\rm \langle3D\rangle: -0.17}_{\rm 1D: -0.19}$  & 0.01 & 670.8 & 1.75 & -- & $^{\rm \langle3D\rangle: -0.02}_{\rm 1D: -0.29}$ & 0.04 & 670.8 \\ 
\noalign{\smallskip}
O (OH) & 8.72 & --1.52 & 2.14 & $^{\rm \langle3D\rangle: -0.64}_{\rm 1D: -1.49}$ & 0.04 & 4  & --1.75 & 1.81 & $^{\rm \langle3D\rangle: 0.00}_{\rm 1D: -0.92}$ & 0.09 & 9 \\ 
\noalign{\smallskip}
\ion{Na}{i}~ & 6.33 & --3.69 & --0.03 & --0.01 & 0.03 & 2    & --3.79 & --0.22 &  0.02 & 0.05 & 589.5 \\ 
\ion{Mg}{i}~ & 7.58 & --3.11 &  0.55 &  0    & 0.18 & 9    & --3.14 &  0.43 &  0.09 & 0.24 & 9 \\ 
\ion{Al}{i}~ & 6.47 & --3.89 & --0.23 & --0.02 & 0.22 & 2    & --3.75 & --0.18 &  0.04 & 0.22 & 2 \\ 
\ion{Si}{i}~ & 7.55 & --3.75 & --0.09 & --0.01 & 0.02 & 390.5 & --3.48 &  0.09 &  0.07 & 0.04 & 390.5 \\ 
\ion{Ca}{i}~ & 6.36 & --3.65 &  0.01 & --0.07 & 0.02 & 422.6 & --3.68 & --0.11 & --0.04 & 0.04 & 422.6 \\ 
\ion{Ca}{ii}~& 6.36 & --3.68 & --0.18 &  0.10 & 0.14 & 3    & --3.81 & --0.54 &  0.23 & 0.11 & 2 \\ 
\ion{Sc}{ii}~& 3.17 & --3.73 & --0.22 &  0    & 0.18 & 2    & --3.57 & --0.30 &  0.04 & 0.11 & 2 \\ 
\ion{Ti}{ii}~& 5.02 & --3.25 &  0.25 & --0.01 & 0.34 & 19   & --3.45 & --0.18 &  0.09 & 0.23 & 12 \\ 
\ion{Cr}{i}~ & 5.67 & --3.79 & --0.13 & --0.07 & 0.12 & 5    & --3.92 & --0.35 & --0.08 & 0.35 & 4 \\ 
\ion{Cr}{ii}~& 5.67 & --3.38 &  0.12 &  0.08 & 0.10 & 313.2 & --3.30 & --0.03 &  0.24 & 0.30 & 313.2 \\ 
\ion{Mn}{ii}~& 5.39 & --4.01 & --0.51 &  0.09 & 0.17 & 344.1 & --3.86 & --0.59 &  0.14 & 0.37 & 344.1 \\ 
\ion{Fe}{i}~ & 7.50 & --3.66 &  0    & --0.12 & 0.12 & 38   & --3.57 &  0    & --0.07 & 0.21 & 37 \\ 
\ion{Fe}{ii}~& 7.50 & --3.51 &  0    &  0.09 & 0.25 & 13   & --3.27 &  0    &  0.18 & 0.31 & 9 \\ 
\ion{Co}{i}~ & 4.92 & --2.91 &  0.75 & --0.13 & 0.07 & 7   & --2.92 &  0.65 & --0.07 & 0.08 & 4 \\ 
\ion{Ni}{i}~ & 6.25 & --3.49 &  0.17 & --0.19 & 0.18 & 12   & --3.45 &  0.12 & --0.08 & 0.16 & 12 \\ \noalign{\smallskip}
\hline
\end{tabular}
\label{tbl7}      
\end{table}