\begin{table}%t2
\caption{Log of GMRT observations of GRB~030329.}
\label{table:gmrtresults}
\small%\centerline
 {
\begin{tabular}{l c c c}
\hline\hline
Observing Dates & $\Delta$$T$ & Frequency & Flux$^a$ \\
                & (days)    & (MHz)     & (mJy) \\
\hline
2004 Jan. 4.97   &  281.49  &   610  &  $0.90\pm 0.20$ \\
2004 Feb. 26.63  &  334.15  &   610  &  $1.14\pm 0.25$ \\
2004 Apr. 10.49  &  378.01  &   610  &  $0.61\pm 0.11$ \\
2004 Jun. 27.28  &  455.80  &   610  &  $1.01\pm 0.18$ \\
2004 Jun. 28.28  &  456.80  &  1280  &  $1.11\pm 0.13$ \\
2004 Jul. 18.31  &  476.83  &  1280  &  $1.04\pm 0.11$ \\
2004 Jul. 20.28  &  478.80  &   610  &  $0.84\pm 0.17$ \\
2004 Aug. 20.04  &  509.56  &  1280  &  $1.03\pm 0.11$ \\
2004 Sep. 06.00  &  526.52  &   610  &  $0.98\pm 0.15$ \\
2004 Sep. 17.96  &  538.48  &  1280  &  $0.48\pm 0.10$ \\
2004 Dec. 3.00   &  614.52  &   610  &  $1.08\pm 0.35$ \\
2005 Jan. 6.82   &  649.34  &   610  &  $0.50\pm 0.11$ \\
2005 Feb. 8.81   &  682.33  &   325  &  $<$$1.5 (3\sigma)$$^b$ \\
2005 Feb. 13.84  &  687.34  &  1280  &  $0.97\pm 0.14$ \\
2005 Feb. 21.71  &  695.23  &   610  &  $0.47\pm 0.13$ \\
2005 Mar. 10.77  &  712.29  &  1280  &  $0.72\pm 0.07$ \\
2005 Mar. 18.66  &  720.18  &   610  &  $0.69\pm 0.13$ \\
2005 Jun. 17.54  &  811.06  &   610  &  $<$$1.1 (3\sigma)$$^c$ \\
2005 Jun. 28.59  &  702.11  &   325  &  $<$$1.8 (3\sigma)^b$ \\
2005 Jul. 1.19   &  824.71  &  1280  &  $0.53\pm 0.09$ \\
2005 Sep. 2.99   &  888.51  &   610  &  $0.68\pm 0.13$ \\
2005 Oct. 8.20   &  923.72  &  1280  &  $0.49\pm 0.09$ \\
\hline
\end{tabular}}
\medskip
$^a$ The measurement uncertainties are given at $1 \sigma$~level. \\
$^b$ A meaningful formal flux measurement at the GRB position cannot be determined because of confusion by a very nearby, bright source. \\
$^c$ Formal flux measurement at the GRB position gives $0.74\pm 0.36$~mJy.
\end{table}