\begin{table}%t1
\par
\caption{\label{table1}Detected p-modes.}             
\small%\centerline
{                                       
\begin{tabular}{l  l  l l l l}           
\hline\hline                         
$f$ [mHz] &   & \multicolumn{1}{c}{Amplitude,}  &    \multicolumn{1}{c}{$a$}    &     \multicolumn{1}{c}{[ppm] } &    References \\     
             &  2004+2005 & 2004 & 2005  & $2004^1$ &                \\
\hline                                    
0.7041 &  7.1  & 7.4  &  4.7    &  8.0 & 3 \\      
0.7206 &  6.0  & 6.0  &  5.6    & --& 2, 4  \\    
0.7525 &  (5.6)  & 6.2  &  5.3    &  (6.6) & 3 \\    
(0.7692) & 6.2 & 6.3  &  4.0    & 7.5 & 3 \\       
0.8027 &  (5.0)  & 5.7  &   4.0   &-- &  2, 3 \\        
0.9158 &  6.1  & 6.6  &  5.3    & 9.0 & 2, 4 \\     
1.0232 &  5.8  & 6.0  &  3.6    & -- & 2, 3, 4 \\    
(1.0726)& 6.2  & 9.2  &  8.1    & 7.6 &  3 \\      
1.1136 &  5.4  & 5.7  &  3.9    &-- & 4  \\    
1.1837 &  5.6  & 6.5  &   2.1    &--  & 2, 3 \\      
1.1959 &  6.9  & 7.8  & 3.5    &(6.2) & 2, 4\\     
1.2158 &   5.0 & 5.4  &    4.2    & -- & 3 \\        
1.2415 &  6.5  & 7.6  &  5.2    &(5.2) & 3 \\      
1.2692 &  5.9  & 6.1  &  3.3    &(5.7) & 2, 3, 4 \\  
1.3547 &  5.2  & 5.9  &  3.3    & (6.0)&  3\\      
1.5590 &  4.9  & 4.9  &   4.4    & --  & 2, 4\\      
\hline                                              
\end{tabular}}
\smallskip
 $^1$ \citet{matt}.\\
 $^2$ \citet{egge}.\\
 $^3$ \citet{mart}
 $^4$ \citet{lecc}; raw data and fits to Ref.~2.
\end{table}