\begin{table}%t2
\par
\caption{Overall best-fit parameters.}
\small%\centering
\par
\begin{tabular}{c c c c c c c c}
 \hline\hline\noalign{\smallskip}
$i$ & $x_0$ & $ y_0$ & $\theta$ & $ v_{sys}$ & ${\it\Upsilon_V} $ & $M_{\rm
    BH}$ & $\chi^2_{r}$  \\
$({^\circ})$ &  (\arcsec) &  (\arcsec) &  $({^\circ})$ &  (\kms) &
  $(M_{\odot}/L_{\odot})_V$ & $(M_{\odot}$) & \\  \hline\noalign{\smallskip}
40 & 0.03 & --0.01 & 34 &
2780 & 7.7 & $6.8\times10^8$ & 15.49 \\ \hline
\end{tabular}
\label{bestfit}
\end{table}